Muons in barium fluoride (BaF_{2})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.42207 & 4.893 & 375.9 & 0.15991 & 2.8867 & −0.0099 & 3.3870 & 5.4116 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.793  4.793  1.176 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.776  3.776  2.125 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.976  2.976  3.935 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.331  2.331  7.782 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.003  2.003  1.244 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.523  1.523  3.604 × 10^{1}
100. MeV 1.764 × 10^{2} 1.437  1.437  4.959 × 10^{1}
140. MeV 2.218 × 10^{2} 1.352  1.352  7.841 × 10^{1}
200. MeV 2.868 × 10^{2} 1.310  1.310  1.236 × 10^{2}
256. MeV 3.462 × 10^{2} 1.303  0.000  1.303 Minimum ionization
300. MeV 3.917 × 10^{2} 1.305  0.000  0.000  1.306  2.003 × 10^{2}
400. MeV 4.945 × 10^{2} 1.322  0.000  0.000  1.323  2.764 × 10^{2}
800. MeV 8.995 × 10^{2} 1.403  0.001  0.000  1.404  5.697 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.436  0.001  0.000  1.437  7.105 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.488  0.001  0.000  0.001  1.491  9.835 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.545  0.002  0.001  0.001  1.550  1.378 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.609  0.004  0.003  0.001  1.618  2.009 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.654  0.006  0.005  0.002  1.667  2.617 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.755  0.015  0.015  0.003  1.788  4.925 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.785  0.020  0.021  0.004  1.830  6.030 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.829  0.031  0.033  0.006  1.899  8.174 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.872  0.048  0.054  0.008  1.983  1.126 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.918  0.078  0.095  0.012  2.103  1.616 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.948  0.111  0.139  0.015  2.214  2.079 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.016  0.250  0.334  0.030  2.631  3.733 × 10^{4}
100. GeV 1.001 × 10^{5} 2.037  0.324  0.439  0.037  2.838  4.465 × 10^{4}
140. GeV 1.401 × 10^{5} 2.067  0.475  0.656  0.051  3.250  5.781 × 10^{4}
200. GeV 2.001 × 10^{5} 2.098  0.713  0.999  0.073  3.884  7.469 × 10^{4}
233. GeV 2.327 × 10^{5} 2.111  0.843  1.183  0.085  4.223 Muon critical energy
300. GeV 3.001 × 10^{5} 2.133  1.118  1.572  0.110  4.934  9.749 × 10^{4}
400. GeV 4.001 × 10^{5} 2.158  1.537  2.167  0.146  6.009  1.158 × 10^{5}
800. GeV 8.001 × 10^{5} 2.218  3.268  4.606  0.295  10.389  1.659 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.238  4.157  5.855  0.371  12.622  1.833 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.268  5.940  8.344  0.526  17.079  2.105 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.300  8.668  12.145  0.761  23.874  2.400 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.337  13.223  18.460  1.163  35.184  2.743 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.364  17.839  24.844  1.572  46.620  2.990 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.429  36.453  50.507  3.270  92.659  3.587 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.451  45.834  63.408  4.141 115.835  3.779 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.484  64.546  89.147  5.932 162.110  4.070 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.519  92.781 127.924  8.678 231.904  4.378 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.560 139.787 192.439  13.426 348.213  4.727 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.589 186.965 257.109  18.288 464.952  4.975 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.662 375.962 515.980  38.604 933.209  5.570 × 10^{5}
100. TeV 1.000 × 10^{8} 2.686 470.624 645.539  49.102 1167.952  5.761 × 10^{5}