Muons in barium (Ba)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
56 (Ba) 137.327(7)  3.500  491.0 0.18268 2.8906 0.4190 3.4547 6.3153  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.394  4.394  1.297 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.476  3.476  2.331 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.750  2.750  4.292 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.160  2.160  8.449 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.859  1.860  1.347 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.420  1.420  3.883 × 10^{1}
100. MeV 1.764 × 10^{2} 1.342  1.342  5.335 × 10^{1}
140. MeV 2.218 × 10^{2} 1.268  1.268  8.414 × 10^{1}
200. MeV 2.868 × 10^{2} 1.234  1.234  1.323 × 10^{2}
233. MeV 3.220 × 10^{2} 1.231  1.231 Minimum ionization
300. MeV 3.917 × 10^{2} 1.237  0.000  0.000  1.237  2.134 × 10^{2}
400. MeV 4.945 × 10^{2} 1.258  0.000  0.000  1.259  2.936 × 10^{2}
800. MeV 8.995 × 10^{2} 1.346  0.001  0.000  1.347  6.002 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.381  0.001  0.000  1.382  7.467 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.435  0.002  0.000  0.001  1.438  1.030 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.494  0.003  0.001  0.001  1.500  1.438 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.561  0.005  0.003  0.001  1.570  2.089 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.606  0.007  0.006  0.002  1.621  2.715 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.709  0.018  0.018  0.003  1.749  5.081 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.740  0.024  0.025  0.004  1.793  6.210 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.784  0.037  0.040  0.005  1.867  8.395 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.827  0.057  0.065  0.008  1.958  1.153 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.873  0.094  0.114  0.011  2.093  1.647 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.903  0.133  0.167  0.015  2.219  2.111 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.970  0.300  0.401  0.029  2.702  3.741 × 10^{4}
100. GeV 1.001 × 10^{5} 1.990  0.389  0.528  0.036  2.944  4.450 × 10^{4}
140. GeV 1.401 × 10^{5} 2.020  0.571  0.788  0.050  3.429  5.708 × 10^{4}
194. GeV 1.937 × 10^{5} 2.047  0.825  1.154  0.068  4.096 Muon critical energy
200. GeV 2.001 × 10^{5} 2.050  0.856  1.199  0.071  4.177  7.291 × 10^{4}
300. GeV 3.001 × 10^{5} 2.084  1.343  1.887  0.106  5.421  9.388 × 10^{4}
400. GeV 4.001 × 10^{5} 2.108  1.846  2.599  0.141  6.696  1.105 × 10^{5}
800. GeV 8.001 × 10^{5} 2.166  3.923  5.521  0.286  11.897  1.547 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.185  4.989  7.015  0.359  14.550  1.699 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.214  7.128  9.996  0.509  19.848  1.933 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.245  10.399  14.545  0.736  27.926  2.187 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.281  15.859  22.104  1.125  41.370  2.479 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.307  21.392  29.743  1.520  54.963  2.689 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.370  43.697  60.450  3.158 109.677  3.194 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.391  54.937  75.885  3.999 137.213  3.356 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.423  77.356 106.683  5.725 192.189  3.602 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.457 111.182 153.078  8.370 275.088  3.861 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.496 167.494 230.266  12.939 413.196  4.156 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.525 224.007 307.636  17.614 551.783  4.364 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.595 450.390 617.341  37.132 1107.460  4.866 × 10^{5}
100. TeV 1.000 × 10^{8} 2.618 563.770 772.340  47.210 1385.940  5.027 × 10^{5}