Muons in bakelite [(C_{43}H_{38}O_{7})_{n}]

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.52792 & 1.250 & 72.4 & 0.12713 & 3.3470 & 0.1471 & 2.6055 & 3.2582 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.609  7.610  7.260 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.935  5.935  1.328 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.634  4.634  2.485 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.595  3.595  4.969 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.069  3.069  8.000 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.302  2.302  2.352 × 10^{1}
100. MeV 1.764 × 10^{2} 2.156  2.156  3.252 × 10^{1}
140. MeV 2.218 × 10^{2} 2.008  2.008  5.184 × 10^{1}
200. MeV 2.868 × 10^{2} 1.922  1.922  8.250 × 10^{1}
300. MeV 3.917 × 10^{2} 1.889  0.000  1.889  1.351 × 10^{2}
318. MeV 4.105 × 10^{2} 1.889  0.000  1.889 Minimum ionization
400. MeV 4.945 × 10^{2} 1.895  0.000  1.895  1.880 × 10^{2}
800. MeV 8.995 × 10^{2} 1.966  0.000  0.000  1.966  3.953 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.998  0.000  0.000  1.999  4.962 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.051  0.000  0.001  2.052  6.936 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.109  0.001  0.000  0.001  2.111  9.817 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.175  0.001  0.001  0.001  2.178  1.448 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.221  0.001  0.001  0.002  2.225  1.902 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.326  0.003  0.003  0.004  2.336  3.651 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.358  0.004  0.004  0.005  2.371  4.500 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.404  0.006  0.007  0.007  2.424  6.168 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.451  0.010  0.011  0.009  2.481  8.612 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.502  0.016  0.019  0.014  2.551  1.258 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.537  0.023  0.028  0.018  2.606  1.646 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.616  0.051  0.069  0.034  2.771  3.132 × 10^{4}
100. GeV 1.001 × 10^{5} 2.641  0.067  0.091  0.043  2.842  3.845 × 10^{4}
140. GeV 1.401 × 10^{5} 2.678  0.099  0.137  0.059  2.973  5.220 × 10^{4}
200. GeV 2.001 × 10^{5} 2.717  0.149  0.210  0.084  3.160  7.177 × 10^{4}
300. GeV 3.001 × 10^{5} 2.761  0.235  0.334  0.126  3.455  1.020 × 10^{5}
400. GeV 4.001 × 10^{5} 2.792  0.324  0.463  0.168  3.747  1.298 × 10^{5}
800. GeV 8.001 × 10^{5} 2.867  0.697  1.003  0.339  4.905  2.228 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.892  0.889  1.282  0.426  5.489  2.613 × 10^{5}
1.11 TeV 1.110 × 10^{6} 2.903  0.995  1.434  0.475  5.807 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.929  1.277  1.837  0.604  6.647  3.275 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.969  1.874  2.688  0.874  8.406  4.076 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.016  2.874  4.106  1.340  11.335  5.097 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.049  3.891  5.544  1.813  14.298  5.881 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.131  8.014  11.337  3.786  26.268  7.914 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.158  10.100  14.255  4.802  32.315  8.599 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.199  14.262  20.069  6.896  44.425  9.651 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.243  20.559  28.839  10.113  62.755  1.078 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.294  31.044  43.431  15.700  93.469  1.208 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.331  41.587  58.071  21.434 124.423  1.300 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.422  83.847 116.682  45.505 249.456  1.523 × 10^{6}
100. TeV 1.000 × 10^{8} 3.452 105.028 146.023  57.986 312.489  1.595 × 10^{6}