Muons in b-100 Bone-equivalent plastic

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.52740 & 1.450 & 85.9 & 0.05268 & 3.7365 & 0.1252 & 3.0420 & 3.4528 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.435  7.435  7.443 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.803  5.803  1.360 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.535  4.535  2.543 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.521  3.521  5.080 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.008  3.008  8.173 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.256  2.256  2.401 × 10^{1}
100. MeV 1.764 × 10^{2} 2.115  2.115  3.319 × 10^{1}
140. MeV 2.218 × 10^{2} 1.971  1.971  5.287 × 10^{1}
200. MeV 2.868 × 10^{2} 1.889  1.889  8.408 × 10^{1}
300. MeV 3.917 × 10^{2} 1.859  0.000  1.859  1.376 × 10^{2}
314. MeV 4.065 × 10^{2} 1.859  0.000  1.859 Minimum ionization
400. MeV 4.945 × 10^{2} 1.866  0.000  1.866  1.913 × 10^{2}
800. MeV 8.995 × 10^{2} 1.940  0.000  0.000  1.940  4.016 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.973  0.000  0.000  1.974  5.037 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.027  0.000  0.000  0.001  2.028  7.036 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.086  0.001  0.000  0.001  2.088  9.949 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.153  0.001  0.001  0.001  2.157  1.466 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.200  0.002  0.001  0.002  2.205  1.924 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.308  0.004  0.004  0.004  2.320  3.687 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.341  0.006  0.006  0.005  2.357  4.542 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.388  0.008  0.009  0.007  2.412  6.218 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.436  0.013  0.015  0.009  2.473  8.673 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.487  0.021  0.026  0.013  2.548  1.265 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.522  0.030  0.039  0.017  2.609  1.653 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.602  0.069  0.093  0.034  2.798  3.131 × 10^{4}
100. GeV 1.001 × 10^{5} 2.627  0.090  0.123  0.042  2.881  3.835 × 10^{4}
140. GeV 1.401 × 10^{5} 2.663  0.132  0.184  0.058  3.038  5.187 × 10^{4}
200. GeV 2.001 × 10^{5} 2.702  0.199  0.282  0.083  3.266  7.091 × 10^{4}
300. GeV 3.001 × 10^{5} 2.746  0.313  0.447  0.124  3.630  9.993 × 10^{4}
400. GeV 4.001 × 10^{5} 2.777  0.432  0.619  0.165  3.993  1.262 × 10^{5}
800. GeV 8.001 × 10^{5} 2.852  0.925  1.332  0.334  5.444  2.116 × 10^{5}
877. GeV 8.772 × 10^{5} 2.863  1.023  1.473  0.367  5.725 Muon critical energy
1.00 TeV 1.000 × 10^{6} 2.877  1.180  1.700  0.420  6.176  2.461 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.914  1.692  2.432  0.595  7.634  3.043 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.954  2.479  3.554  0.862  9.849  3.733 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.001  3.796  5.420  1.321  13.539  4.596 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.034  5.136  7.311  1.788  17.269  5.248 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.116  10.556  14.927  3.730  32.330  6.914 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.143  13.296  18.761  4.731  39.931  7.470 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.184  18.764  26.404  6.792  55.143  8.319 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.228  27.031  37.928  9.958  78.146  9.228 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.279  40.792  57.102  15.452 116.625  1.027 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.316  54.620  76.334  21.091 155.362  1.101 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.407 110.058 153.330  44.748 311.543  1.279 × 10^{6}
100. TeV 1.000 × 10^{8} 3.437 137.844 191.873  57.009 390.162  1.337 × 10^{6}