Muons in arsenic (As)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
33 (As) 74.921595(6) 5.730  347.0 0.06633 3.4176 0.1767 3.5702 5.0510  0.08
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.040  5.040  1.122 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.973  3.973  2.025 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.133  3.133  3.744 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.453  2.453  7.400 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.107  2.107  1.183 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.600  1.600  3.428 × 10^{1}
100. MeV 1.764 × 10^{2} 1.510  1.510  4.717 × 10^{1}
140. MeV 2.218 × 10^{2} 1.422  1.422  7.458 × 10^{1}
200. MeV 2.868 × 10^{2} 1.378  1.378  1.176 × 10^{2}
257. MeV 3.471 × 10^{2} 1.370  0.000  1.370 Minimum ionization
300. MeV 3.917 × 10^{2} 1.373  0.000  0.000  1.373  1.905 × 10^{2}
400. MeV 4.945 × 10^{2} 1.389  0.000  0.000  1.390  2.629 × 10^{2}
800. MeV 8.995 × 10^{2} 1.472  0.001  0.000  1.472  5.422 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.505  0.001  0.000  1.506  6.765 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.558  0.001  0.000  0.001  1.560  9.372 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.615  0.002  0.001  0.001  1.619  1.314 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.680  0.003  0.002  0.001  1.687  1.918 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.725  0.005  0.004  0.002  1.736  2.502 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.826  0.012  0.012  0.003  1.854  4.724 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.857  0.016  0.017  0.004  1.894  5.790 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.900  0.025  0.028  0.006  1.959  7.865 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.944  0.038  0.045  0.008  2.036  1.087 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.990  0.063  0.078  0.012  2.144  1.565 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.021  0.089  0.114  0.016  2.240  2.021 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.091  0.200  0.274  0.030  2.596  3.677 × 10^{4}
100. GeV 1.001 × 10^{5} 2.112  0.260  0.359  0.038  2.769  4.423 × 10^{4}
140. GeV 1.401 × 10^{5} 2.143  0.381  0.537  0.052  3.114  5.784 × 10^{4}
200. GeV 2.001 × 10^{5} 2.176  0.572  0.817  0.074  3.640  7.565 × 10^{4}
290. GeV 2.898 × 10^{5} 2.209  0.863  1.238  0.108  4.420 Muon critical energy
300. GeV 3.001 × 10^{5} 2.213  0.897  1.288  0.111  4.510  1.003 × 10^{5}
400. GeV 4.001 × 10^{5} 2.238  1.234  1.775  0.149  5.397  1.205 × 10^{5}
800. GeV 8.001 × 10^{5} 2.301  2.627  3.776  0.300  9.005  1.773 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.322  3.343  4.801  0.378  10.844  1.975 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.353  4.779  6.845  0.535  14.514  2.293 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.387  6.978  9.967  0.774  20.107  2.643 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.425  10.652  15.156  1.184  29.418  3.052 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.453  14.378  20.402  1.600  38.834  3.347 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.521  29.408  41.497  3.327  76.755  4.066 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.544  36.986  52.104  4.215  95.850  4.298 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.578  52.103  73.265  6.038 133.985  4.650 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.615  74.922 105.148  8.832 191.518  5.022 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.658 112.909 158.197  13.665 287.430  5.446 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.689 151.042 211.379  18.614 383.725  5.746 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.765 303.838 424.259  39.294 770.156  6.467 × 10^{5}
100. TeV 1.000 × 10^{8} 2.790 380.380 530.800  49.980 963.950  6.699 × 10^{5}