Muons in argon gas (Ar)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
18 (Ar) 39.948(1) 1.662 × 10^{−3} 188.0 0.19714 2.9618 1.7635 4.4855 11.9480 0.00
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.687  5.687  9.834 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.461  4.461  1.786 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.502  3.502  3.321 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.731  2.731  6.598 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.340  2.340  1.058 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.771  1.771  3.084 × 10^{1}
100. MeV 1.764 × 10^{2} 1.670  1.670  4.250 × 10^{1}
140. MeV 2.218 × 10^{2} 1.572  1.572  6.731 × 10^{1}
200. MeV 2.868 × 10^{2} 1.525  1.526  1.062 × 10^{2}
242. MeV 3.316 × 10^{2} 1.519  0.000  1.520 Minimum ionization
300. MeV 3.917 × 10^{2} 1.525  0.000  1.526  1.719 × 10^{2}
400. MeV 4.945 × 10^{2} 1.551  0.000  0.000  1.551  2.369 × 10^{2}
800. MeV 8.995 × 10^{2} 1.666  0.000  0.000  1.667  4.854 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.714  0.000  0.000  1.715  6.037 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.791  0.001  0.000  0.001  1.793  8.316 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.878  0.001  0.001  0.001  1.881  1.158 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.980  0.002  0.001  0.001  1.985  1.675 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.054  0.003  0.002  0.002  2.061  2.168 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.226  0.007  0.007  0.004  2.244  4.018 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.277  0.010  0.010  0.004  2.301  4.897 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.349  0.015  0.016  0.006  2.386  6.603 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.420  0.023  0.026  0.008  2.477  9.068 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.494  0.037  0.046  0.012  2.589  1.301 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.542  0.052  0.067  0.016  2.678  1.681 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.647  0.118  0.161  0.032  2.959  3.098 × 10^{4}
100. GeV 1.001 × 10^{5} 2.677  0.153  0.212  0.039  3.083  3.760 × 10^{4}
140. GeV 1.401 × 10^{5} 2.721  0.225  0.318  0.055  3.319  5.010 × 10^{4}
200. GeV 2.001 × 10^{5} 2.764  0.338  0.485  0.078  3.666  6.729 × 10^{4}
300. GeV 3.001 × 10^{5} 2.810  0.532  0.766  0.117  4.225  9.268 × 10^{4}
400. GeV 4.001 × 10^{5} 2.842  0.732  1.058  0.156  4.787  1.149 × 10^{5}
572. GeV 5.723 × 10^{5} 2.879  1.085  1.571  0.223  5.759 Muon critical energy
800. GeV 8.001 × 10^{5} 2.913  1.561  2.258  0.314  7.048  1.833 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.935  1.989  2.874  0.395  8.194  2.096 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.969  2.847  4.104  0.560  10.480  2.527 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.003  4.161  5.985  0.810  13.960  3.022 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.043  6.360  9.110  1.240  19.754  3.621 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.071  8.592  12.272  1.677  25.613  4.064 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.141  17.605  24.995  3.493  49.235  5.171 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.164  22.154  31.395  4.427  61.141  5.535 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.199  31.236  44.156  6.347  84.938  6.088 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.237  44.956  63.386  9.292 120.872  6.677 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.281  67.769  95.400  14.391 180.841  7.349 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.312  90.675 127.504  19.616 241.108  7.826 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.390 182.502 256.012  41.480 483.384  8.975 × 10^{5}
100. TeV 1.000 × 10^{8} 3.416 228.520 320.330  52.790 605.056  9.344 × 10^{5}