Muons in antimony (Sb)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
51 (Sb) 121.760(1)  6.691  487.0 0.16652 2.9319 0.3189 3.3489 5.6241  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.516  4.516  1.262 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.573  3.573  2.268 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.826  2.826  4.176 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.220  2.220  8.221 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.910  1.911  1.311 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.458  1.458  3.780 × 10^{1}
100. MeV 1.764 × 10^{2} 1.377  1.377  5.195 × 10^{1}
140. MeV 2.218 × 10^{2} 1.300  1.300  8.198 × 10^{1}
200. MeV 2.868 × 10^{2} 1.264  1.264  1.290 × 10^{2}
242. MeV 3.316 × 10^{2} 1.259  1.259 Minimum ionization
300. MeV 3.917 × 10^{2} 1.264  0.000  0.000  1.264  2.083 × 10^{2}
400. MeV 4.945 × 10^{2} 1.283  0.000  0.000  1.283  2.868 × 10^{2}
800. MeV 8.995 × 10^{2} 1.367  0.001  0.000  1.368  5.883 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.401  0.001  0.000  1.402  7.326 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.454  0.002  0.000  0.001  1.457  1.012 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.512  0.003  0.001  0.001  1.517  1.415 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.577  0.005  0.003  0.001  1.586  2.059 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.621  0.007  0.005  0.002  1.636  2.679 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.722  0.017  0.017  0.003  1.760  5.027 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.753  0.023  0.024  0.004  1.804  6.149 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.796  0.035  0.038  0.005  1.875  8.323 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.839  0.054  0.062  0.008  1.964  1.145 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.884  0.089  0.108  0.011  2.094  1.638 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.915  0.125  0.159  0.015  2.215  2.102 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.982  0.284  0.381  0.029  2.676  3.742 × 10^{4}
100. GeV 1.001 × 10^{5} 2.002  0.367  0.501  0.036  2.907  4.458 × 10^{4}
140. GeV 1.401 × 10^{5} 2.032  0.539  0.747  0.050  3.370  5.736 × 10^{4}
200. GeV 2.001 × 10^{5} 2.063  0.808  1.138  0.071  4.081  7.352 × 10^{4}
204. GeV 2.043 × 10^{5} 2.064  0.827  1.165  0.073  4.130 Muon critical energy
300. GeV 3.001 × 10^{5} 2.097  1.268  1.791  0.107  5.264  9.505 × 10^{4}
400. GeV 4.001 × 10^{5} 2.122  1.743  2.467  0.143  6.476  1.122 × 10^{5}
800. GeV 8.001 × 10^{5} 2.182  3.704  5.241  0.289  11.417  1.581 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.201  4.712  6.660  0.363  13.937  1.739 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.231  6.732  9.490  0.514  18.969  1.984 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.263  9.822  13.810  0.744  26.640  2.250 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.300  14.982  20.989  1.137  39.409  2.557 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.326  20.211  28.244  1.537  52.319  2.776 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.391  41.295  57.409  3.193 104.289  3.307 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.412  51.920  72.070  4.043 130.447  3.479 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.445  73.113 101.322  5.789 182.670  3.737 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.480 105.090 145.388  8.464 261.424  4.010 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.521 158.325 218.706  13.085 392.638  4.320 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.550 211.753 292.198  17.815 524.318  4.539 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.622 425.795 586.386  37.562 1052.366  5.067 × 10^{5}
100. TeV 1.000 × 10^{8} 2.646 533.000 733.620  47.760 1317.027  5.237 × 10^{5}