Muons in anthracene (C_{14}H_{10})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.52740 & 1.283 & 69.5 & 0.14677 & 3.2831 & 0.1146 & 2.5213 & 3.1514 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.642  7.642  7.227 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.959  5.959  1.322 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.652  4.652  2.474 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.608  3.608  4.950 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.080  3.080  7.969 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.305  2.305  2.345 × 10^{1}
100. MeV 1.764 × 10^{2} 2.159  2.159  3.244 × 10^{1}
140. MeV 2.218 × 10^{2} 2.010  2.010  5.173 × 10^{1}
200. MeV 2.868 × 10^{2} 1.923  1.924  8.237 × 10^{1}
300. MeV 3.917 × 10^{2} 1.890  0.000  1.890  1.350 × 10^{2}
318. MeV 4.105 × 10^{2} 1.889  0.000  1.890 Minimum ionization
400. MeV 4.945 × 10^{2} 1.895  0.000  1.895  1.878 × 10^{2}
800. MeV 8.995 × 10^{2} 1.965  0.000  0.000  1.966  3.952 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.997  0.000  0.000  1.998  4.961 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.049  0.000  0.001  2.050  6.936 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.107  0.000  0.000  0.001  2.109  9.819 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.173  0.001  0.001  0.001  2.175  1.448 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.218  0.001  0.001  0.002  2.222  1.903 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.322  0.003  0.003  0.004  2.332  3.655 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.354  0.004  0.004  0.005  2.367  4.506 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.400  0.006  0.006  0.007  2.419  6.176 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.447  0.009  0.011  0.009  2.476  8.626 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.498  0.015  0.018  0.014  2.545  1.261 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.532  0.022  0.027  0.018  2.599  1.649 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.612  0.049  0.066  0.034  2.761  3.140 × 10^{4}
100. GeV 1.001 × 10^{5} 2.636  0.064  0.087  0.043  2.830  3.855 × 10^{4}
140. GeV 1.401 × 10^{5} 2.673  0.094  0.131  0.059  2.958  5.237 × 10^{4}
200. GeV 2.001 × 10^{5} 2.712  0.142  0.201  0.084  3.139  7.206 × 10^{4}
300. GeV 3.001 × 10^{5} 2.756  0.224  0.319  0.126  3.426  1.025 × 10^{5}
400. GeV 4.001 × 10^{5} 2.787  0.310  0.443  0.168  3.708  1.306 × 10^{5}
800. GeV 8.001 × 10^{5} 2.862  0.666  0.959  0.340  4.827  2.248 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.887  0.851  1.226  0.427  5.390  2.640 × 10^{5}
1.15 TeV 1.149 × 10^{6} 2.902  0.987  1.422  0.493  5.805 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.924  1.222  1.758  0.605  6.509  3.315 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.964  1.793  2.573  0.876  8.207  4.134 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.011  2.751  3.930  1.343  11.035  5.181 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.044  3.725  5.308  1.818  13.895  5.987 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.126  7.675  10.857  3.796  25.454  8.083 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.153  9.673  13.653  4.815  31.294  8.790 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.194  13.661  19.223  6.915  42.993  9.877 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.238  19.695  27.626  10.142  60.701  1.105 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.289  29.742  41.606  15.745  90.382  1.239 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.326  39.846  55.632  21.497 120.300  1.334 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.417  80.336 111.787  45.645 241.186  1.565 × 10^{6}
100. TeV 1.000 × 10^{8} 3.447 100.629 139.899  58.167 302.142  1.639 × 10^{6}