Muons in aniline (C_{6}H_{5}NH_{2})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.53699 & 1.023 & 66.2 & 0.13134 & 3.3434 & 0.1618 & 2.5805 & 3.2622 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.829  7.830  7.051 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.104  6.104  1.290 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.764  4.764  2.415 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.694  3.694  4.833 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.153  3.153  7.782 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.365  2.365  2.290 × 10^{1}
100. MeV 1.764 × 10^{2} 2.215  2.215  3.166 × 10^{1}
140. MeV 2.218 × 10^{2} 2.062  2.062  5.046 × 10^{1}
200. MeV 2.868 × 10^{2} 1.974  1.974  8.032 × 10^{1}
300. MeV 3.917 × 10^{2} 1.939  0.000  1.939  1.316 × 10^{2}
318. MeV 4.105 × 10^{2} 1.939  0.000  1.939 Minimum ionization
400. MeV 4.945 × 10^{2} 1.944  0.000  1.945  1.831 × 10^{2}
800. MeV 8.995 × 10^{2} 2.016  0.000  0.000  2.016  3.852 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.049  0.000  0.000  2.049  4.836 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.102  0.000  0.001  2.103  6.761 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.161  0.000  0.000  0.001  2.163  9.572 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.228  0.001  0.001  0.001  2.231  1.412 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.275  0.001  0.001  0.002  2.279  1.855 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.381  0.003  0.003  0.004  2.391  3.564 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.414  0.004  0.004  0.005  2.427  4.394 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.461  0.006  0.006  0.007  2.480  6.023 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.509  0.009  0.011  0.009  2.538  8.413 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.560  0.015  0.019  0.014  2.608  1.230 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.595  0.022  0.027  0.018  2.663  1.609 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.676  0.050  0.067  0.034  2.828  3.064 × 10^{4}
100. GeV 1.001 × 10^{5} 2.702  0.065  0.088  0.043  2.897  3.763 × 10^{4}
140. GeV 1.401 × 10^{5} 2.739  0.095  0.133  0.059  3.027  5.113 × 10^{4}
200. GeV 2.001 × 10^{5} 2.779  0.144  0.203  0.084  3.210  7.037 × 10^{4}
300. GeV 3.001 × 10^{5} 2.823  0.227  0.323  0.126  3.500  1.002 × 10^{5}
400. GeV 4.001 × 10^{5} 2.855  0.314  0.449  0.168  3.786  1.277 × 10^{5}
800. GeV 8.001 × 10^{5} 2.932  0.675  0.971  0.340  4.918  2.201 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.957  0.862  1.242  0.427  5.487  2.586 × 10^{5}
1.16 TeV 1.163 × 10^{6} 2.974  1.014  1.460  0.500  5.947 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.995  1.238  1.780  0.606  6.619  3.249 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.035  1.817  2.606  0.877  8.336  4.055 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.082  2.788  3.981  1.344  11.195  5.087 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.116  3.776  5.376  1.819  14.087  5.881 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.200  7.779  10.996  3.799  25.773  7.950 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.227  9.805  13.827  4.818  31.678  8.649 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.269  13.847  19.468  6.920  43.504  9.722 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.314  19.964  27.978  10.150  61.406  1.088 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.366  30.151  42.136  15.758  91.410  1.220 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.403  40.394  56.340  21.515 121.653  1.315 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.496  81.456 113.208  45.688 243.850  1.543 × 10^{6}
100. TeV 1.000 × 10^{8} 3.527 102.039 141.677  58.223 305.467  1.616 × 10^{6}