Muons in ammonia (NH_{3})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.59719 & 8.260 × 10^{−4} & 53.7 & 0.08315 & 3.6464 & 1.6822 & 4.1158 & 9.8763 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 8.939  8.939  6.164 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.962  6.962  1.129 × 10^{0}
20.0 MeV 6.802 × 10^{1} 5.429  5.429  2.116 × 10^{0}
30.0 MeV 8.509 × 10^{1} 4.205  4.206  4.238 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.587  3.587  6.830 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.687  2.687  2.013 × 10^{1}
100. MeV 1.764 × 10^{2} 2.525  2.525  2.783 × 10^{1}
140. MeV 2.218 × 10^{2} 2.365  2.366  4.427 × 10^{1}
200. MeV 2.868 × 10^{2} 2.283  2.283  7.019 × 10^{1}
266. MeV 3.567 × 10^{2} 2.265  0.000  2.266 Minimum ionization
300. MeV 3.917 × 10^{2} 2.268  0.000  2.269  1.143 × 10^{2}
400. MeV 4.945 × 10^{2} 2.295  0.000  2.296  1.581 × 10^{2}
800. MeV 8.995 × 10^{2} 2.441  0.000  0.000  2.441  3.270 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.503  0.000  0.000  2.504  4.078 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.605  0.000  0.001  2.606  5.643 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.719  0.001  0.000  0.001  2.721  7.893 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.855  0.001  0.001  0.001  2.858  1.147 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.952  0.001  0.001  0.002  2.956  1.491 × 10^{3}
8.00 GeV 8.105 × 10^{3} 3.155  0.003  0.003  0.004  3.165  2.791 × 10^{3}
10.0 GeV 1.011 × 10^{4} 3.210  0.004  0.004  0.005  3.224  3.417 × 10^{3}
14.0 GeV 1.411 × 10^{4} 3.289  0.006  0.007  0.007  3.309  4.641 × 10^{3}
20.0 GeV 2.011 × 10^{4} 3.365  0.010  0.011  0.009  3.395  6.429 × 10^{3}
30.0 GeV 3.011 × 10^{4} 3.443  0.016  0.020  0.014  3.493  9.330 × 10^{3}
40.0 GeV 4.011 × 10^{4} 3.495  0.023  0.029  0.018  3.564  1.216 × 10^{4}
80.0 GeV 8.011 × 10^{4} 3.605  0.052  0.070  0.035  3.762  2.306 × 10^{4}
100. GeV 1.001 × 10^{5} 3.637  0.068  0.093  0.043  3.841  2.833 × 10^{4}
140. GeV 1.401 × 10^{5} 3.684  0.100  0.139  0.060  3.983  3.855 × 10^{4}
200. GeV 2.001 × 10^{5} 3.731  0.151  0.213  0.085  4.180  5.325 × 10^{4}
300. GeV 3.001 × 10^{5} 3.783  0.239  0.340  0.127  4.488  7.632 × 10^{4}
400. GeV 4.001 × 10^{5} 3.819  0.330  0.471  0.169  4.789  9.789 × 10^{4}
800. GeV 8.001 × 10^{5} 3.905  0.710  1.020  0.342  5.977  1.725 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.933  0.907  1.304  0.429  6.574  2.044 × 10^{5}
1.40 TeV 1.400 × 10^{6} 3.975  1.303  1.870  0.609  7.757  2.603 × 10^{5}
1.47 TeV 1.469 × 10^{6} 3.981  1.373  1.968  0.640  7.963 Muon critical energy
2.00 TeV 2.000 × 10^{6} 4.021  1.913  2.737  0.882  9.553  3.299 × 10^{5}
3.00 TeV 3.000 × 10^{6} 4.073  2.937  4.181  1.351  12.542  4.210 × 10^{5}
4.00 TeV 4.000 × 10^{6} 4.111  3.979  5.647  1.828  15.564  4.925 × 10^{5}
8.00 TeV 8.000 × 10^{6} 4.203  8.202  11.550  3.818  27.774  6.823 × 10^{5}
10.0 TeV 1.000 × 10^{7} 4.234  10.340  14.524  4.843  33.941  7.473 × 10^{5}
14.0 TeV 1.400 × 10^{7} 4.280  14.607  20.449  6.957  46.294  8.478 × 10^{5}
20.0 TeV 2.000 × 10^{7} 4.330  21.067  29.387  10.205  64.990  9.567 × 10^{5}
30.0 TeV 3.000 × 10^{7} 4.388  31.825  44.257  15.847  96.318  1.082 × 10^{6}
40.0 TeV 4.000 × 10^{7} 4.430  42.647  59.175  21.640 127.892  1.172 × 10^{6}
80.0 TeV 8.000 × 10^{7} 4.533  86.070 118.900  45.974 255.478  1.389 × 10^{6}
100. TeV 1.000 × 10^{8} 4.567 107.853 148.799  58.595 319.815  1.459 × 10^{6}