Muons in americium (Am)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
95 (Am) [243.06138(2)] 13.670  934.0 0.20308 2.7615 0.2274 3.5021 6.2813  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.660  3.660  1.602 × 10^{0}
14.0 MeV 5.616 × 10^{1} 2.933  2.933  2.834 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.345  2.345  5.144 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.860  1.860  9.992 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.609  1.609  1.581 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.239  1.239  4.496 × 10^{1}
100. MeV 1.764 × 10^{2} 1.174  1.174  6.158 × 10^{1}
140. MeV 2.218 × 10^{2} 1.115  1.115  9.670 × 10^{1}
200. MeV 2.868 × 10^{2} 1.090  1.090  1.513 × 10^{2}
223. MeV 3.114 × 10^{2} 1.089  0.000  1.089 Minimum ionization
300. MeV 3.917 × 10^{2} 1.097  0.000  0.000  1.097  2.429 × 10^{2}
400. MeV 4.945 × 10^{2} 1.118  0.000  0.000  1.119  3.332 × 10^{2}
800. MeV 8.995 × 10^{2} 1.204  0.001  0.000  1.205  6.770 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.237  0.002  0.000  1.239  8.406 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.289  0.003  0.001  1.293  1.156 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.346  0.004  0.001  0.001  1.352  1.610 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.410  0.008  0.003  0.001  1.422  2.329 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.454  0.011  0.006  0.002  1.473  3.020 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.553  0.028  0.023  0.003  1.608  5.607 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.583  0.038  0.033  0.004  1.658  6.831 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.626  0.057  0.055  0.005  1.744  9.182 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.668  0.089  0.091  0.007  1.856  1.251 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.713  0.146  0.161  0.011  2.032  1.766 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.743  0.207  0.238  0.014  2.203  2.238 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.808  0.468  0.579  0.027  2.884  3.821 × 10^{4}
100. GeV 1.001 × 10^{5} 1.828  0.606  0.764  0.034  3.233  4.476 × 10^{4}
127. GeV 1.266 × 10^{5} 1.848  0.792  1.013  0.043  3.698 Muon critical energy
140. GeV 1.401 × 10^{5} 1.856  0.889  1.143  0.047  3.938  5.596 × 10^{4}
200. GeV 2.001 × 10^{5} 1.886  1.332  1.745  0.067  5.032  6.941 × 10^{4}
300. GeV 3.001 × 10^{5} 1.918  2.088  2.750  0.101  6.859  8.638 × 10^{4}
400. GeV 4.001 × 10^{5} 1.941  2.869  3.791  0.134  8.737  9.927 × 10^{4}
800. GeV 8.001 × 10^{5} 1.997  6.089  8.059  0.272  16.419  1.322 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.015  7.741  10.243  0.341  20.343  1.431 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.043  11.051  14.596  0.483  28.175  1.597 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.073  16.109  21.239  0.699  40.122  1.775 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.107  24.547  32.275  1.068  60.000  1.977 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.132  33.092  43.428  1.443  80.097  2.121 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.192  67.519  88.252  2.995 160.961  2.466 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.212  84.857 110.780  3.792 201.643  2.577 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.243 119.437 155.733  5.426 282.841  2.744 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.276 171.590 223.446  7.928 405.242  2.920 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.313 258.497 336.096  12.248 609.156  3.120 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.341 345.716 449.004  16.667 813.729  3.262 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.408 694.567 900.941  35.104 1633.022  3.602 × 10^{5}
100. TeV 1.000 × 10^{8} 2.430 869.100 1127.110  44.620 2043.262  3.711 × 10^{5}