Muons in amber (C_{10}H_{16}O)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.55179 & 1.100 & 63.2 & 0.11934 & 3.4098 & 0.1335 & 2.5610 & 3.0701 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 8.093  8.093  6.818 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.308  6.308  1.248 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.922  4.922  2.337 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.816  3.816  4.677 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.256  3.256  7.532 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.438  2.438  2.217 × 10^{1}
100. MeV 1.764 × 10^{2} 2.282  2.282  3.068 × 10^{1}
140. MeV 2.218 × 10^{2} 2.123  2.123  4.893 × 10^{1}
200. MeV 2.868 × 10^{2} 2.030  2.031  7.794 × 10^{1}
300. MeV 3.917 × 10^{2} 1.993  0.000  1.994  1.278 × 10^{2}
324. MeV 4.161 × 10^{2} 1.993  0.000  1.993 Minimum ionization
400. MeV 4.945 × 10^{2} 1.998  0.000  1.998  1.779 × 10^{2}
800. MeV 8.995 × 10^{2} 2.069  0.000  0.000  2.069  3.748 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.102  0.000  0.000  2.103  4.706 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.156  0.000  0.001  2.157  6.583 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.215  0.000  0.000  0.001  2.217  9.325 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.283  0.001  0.001  0.001  2.286  1.376 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.331  0.001  0.001  0.002  2.335  1.809 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.439  0.003  0.003  0.004  2.449  3.477 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.472  0.004  0.004  0.005  2.485  4.287 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.521  0.006  0.006  0.007  2.540  5.878 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.569  0.009  0.011  0.009  2.599  8.212 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.622  0.015  0.019  0.014  2.670  1.201 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.658  0.022  0.027  0.018  2.725  1.571 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.742  0.049  0.066  0.035  2.892  2.993 × 10^{4}
100. GeV 1.001 × 10^{5} 2.768  0.064  0.088  0.043  2.963  3.676 × 10^{4}
140. GeV 1.401 × 10^{5} 2.806  0.095  0.132  0.060  3.093  4.997 × 10^{4}
200. GeV 2.001 × 10^{5} 2.847  0.143  0.202  0.084  3.277  6.881 × 10^{4}
300. GeV 3.001 × 10^{5} 2.892  0.226  0.322  0.127  3.567  9.805 × 10^{4}
400. GeV 4.001 × 10^{5} 2.925  0.313  0.447  0.169  3.853  1.250 × 10^{5}
800. GeV 8.001 × 10^{5} 3.004  0.673  0.967  0.341  4.985  2.160 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.030  0.859  1.237  0.428  5.554  2.540 × 10^{5}
1.19 TeV 1.194 × 10^{6} 3.050  1.040  1.496  0.515  6.101 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.069  1.234  1.773  0.607  6.684  3.196 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.111  1.811  2.596  0.879  8.398  3.995 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.159  2.780  3.966  1.348  11.253  5.020 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.194  3.766  5.357  1.824  14.141  5.812 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.279  7.761  10.958  3.809  25.809  7.875 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.308  9.783  13.780  4.832  31.704  8.573 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.351  13.819  19.403  6.940  43.513  9.646 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.397  19.927  27.884  10.181  61.389  1.080 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.450  30.098  41.995  15.807  91.351  1.213 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.489  40.328  56.153  21.584 121.554  1.307 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.584  81.338 112.834  45.842 243.598  1.535 × 10^{6}
100. TeV 1.000 × 10^{8} 3.615 101.896 141.209  58.422 305.142  1.609 × 10^{6}