Muons in aluminum (Al)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
13 (Al) 26.9815385(7) 2.699  166.0 0.08024 3.6345 0.1708 3.0127 4.2395  0.12
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.188  6.188  9.023 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.849  4.849  1.640 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.802  3.802  3.053 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.960  2.961  6.075 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.533  2.533  9.750 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.908  1.908  2.851 × 10^{1}
100. MeV 1.764 × 10^{2} 1.797  1.798  3.934 × 10^{1}
140. MeV 2.218 × 10^{2} 1.688  1.688  6.241 × 10^{1}
200. MeV 2.868 × 10^{2} 1.629  1.630  9.871 × 10^{1}
277. MeV 3.683 × 10^{2} 1.615  0.000  1.615 Minimum ionization
300. MeV 3.917 × 10^{2} 1.616  0.000  1.616  1.605 × 10^{2}
400. MeV 4.945 × 10^{2} 1.630  0.000  1.630  2.222 × 10^{2}
800. MeV 8.995 × 10^{2} 1.710  0.000  0.000  1.711  4.616 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.744  0.000  0.000  1.745  5.773 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.797  0.001  0.000  0.001  1.799  8.029 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.855  0.001  0.000  0.001  1.858  1.131 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.920  0.002  0.001  0.001  1.925  1.659 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.965  0.002  0.002  0.002  1.971  2.172 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.067  0.006  0.006  0.004  2.082  4.140 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.097  0.008  0.008  0.005  2.117  5.092 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.141  0.012  0.013  0.006  2.172  6.956 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.185  0.018  0.021  0.009  2.233  9.678 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.233  0.030  0.036  0.013  2.312  1.408 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.265  0.042  0.053  0.017  2.377  1.834 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.338  0.095  0.129  0.033  2.594  3.442 × 10^{4}
100. GeV 1.001 × 10^{5} 2.360  0.123  0.169  0.040  2.693  4.199 × 10^{4}
140. GeV 1.401 × 10^{5} 2.394  0.181  0.253  0.056  2.884  5.634 × 10^{4}
200. GeV 2.001 × 10^{5} 2.429  0.272  0.385  0.080  3.166  7.618 × 10^{4}
300. GeV 3.001 × 10^{5} 2.469  0.427  0.610  0.120  3.627  1.057 × 10^{5}
400. GeV 4.001 × 10^{5} 2.498  0.588  0.845  0.160  4.091  1.316 × 10^{5}
612. GeV 6.124 × 10^{5} 2.540  0.940  1.355  0.245  5.080 Muon critical energy
800. GeV 8.001 × 10^{5} 2.567  1.257  1.813  0.323  5.960  2.122 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.589  1.602  2.312  0.405  6.909  2.433 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.623  2.295  3.304  0.575  8.797  2.945 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.660  3.357  4.823  0.832  11.672  3.535 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.702  5.135  7.347  1.274  16.458  4.254 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.732  6.941  9.902  1.723  21.299  4.786 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.807  14.238  20.187  3.590  40.823  6.120 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.832  17.923  25.362  4.551  50.668  6.559 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.869  25.280  35.679  6.528  70.356  7.226 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.910  36.398  51.230  9.562 100.100  7.937 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.956  54.885  77.116  14.821 149.779  8.749 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.990  73.453 103.077  20.213 199.734  9.325 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.073 147.903 207.008  42.793 400.778  1.071 × 10^{6}
100. TeV 1.000 × 10^{8} 3.100 185.220 259.030  54.480 501.831  1.116 × 10^{6}