Muons in alanine (C_{3}H_{7}NO_{2})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.53976 & 1.420 & 71.9 & 0.11484 & 3.3526 & 0.1354 & 2.6336 & 3.0965 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.787  7.787  7.094 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.073  6.073  1.297 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.742  4.742  2.428 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.678  3.678  4.856 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.140  3.140  7.818 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.353  2.353  2.299 × 10^{1}
100. MeV 1.764 × 10^{2} 2.203  2.203  3.180 × 10^{1}
140. MeV 2.218 × 10^{2} 2.049  2.049  5.072 × 10^{1}
200. MeV 2.868 × 10^{2} 1.960  1.960  8.078 × 10^{1}
300. MeV 3.917 × 10^{2} 1.925  0.000  1.925  1.324 × 10^{2}
325. MeV 4.171 × 10^{2} 1.924  0.000  1.924 Minimum ionization
400. MeV 4.945 × 10^{2} 1.929  0.000  1.930  1.844 × 10^{2}
800. MeV 8.995 × 10^{2} 2.000  0.000  0.000  2.000  3.880 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.032  0.000  0.000  2.033  4.872 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.086  0.000  0.001  2.087  6.813 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.145  0.001  0.000  0.001  2.146  9.645 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.212  0.001  0.001  0.001  2.215  1.423 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.259  0.001  0.001  0.002  2.263  1.869 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.366  0.003  0.003  0.004  2.376  3.589 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.399  0.004  0.004  0.005  2.412  4.424 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.446  0.007  0.007  0.007  2.467  6.063 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.494  0.010  0.012  0.009  2.525  8.465 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.546  0.017  0.021  0.014  2.597  1.237 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.581  0.024  0.030  0.018  2.654  1.617 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.663  0.055  0.074  0.034  2.826  3.076 × 10^{4}
100. GeV 1.001 × 10^{5} 2.688  0.071  0.097  0.043  2.899  3.774 × 10^{4}
140. GeV 1.401 × 10^{5} 2.726  0.105  0.146  0.059  3.036  5.122 × 10^{4}
200. GeV 2.001 × 10^{5} 2.765  0.158  0.224  0.084  3.231  7.037 × 10^{4}
300. GeV 3.001 × 10^{5} 2.810  0.250  0.355  0.126  3.541  9.992 × 10^{4}
400. GeV 4.001 × 10^{5} 2.842  0.345  0.493  0.167  3.847  1.270 × 10^{5}
800. GeV 8.001 × 10^{5} 2.919  0.740  1.065  0.338  5.063  2.174 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.944  0.945  1.361  0.425  5.676  2.546 × 10^{5}
1.08 TeV 1.076 × 10^{6} 2.953  1.022  1.472  0.458  5.906 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.983  1.357  1.950  0.603  6.892  3.185 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.024  1.990  2.853  0.873  8.740  3.957 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.071  3.052  4.357  1.337  11.817  4.937 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.105  4.132  5.882  1.810  14.929  5.688 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.189  8.507  12.024  3.778  27.498  7.633 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.216  10.721  15.118  4.791  33.847  8.288 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.258  15.138  21.283  6.881  46.559  9.291 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.304  21.820  30.581  10.091  65.795  1.037 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.356  32.947  46.052  15.664  98.019  1.161 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.394  44.135  61.573  21.384 130.486  1.249 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.487  88.997 123.711  45.395 261.590  1.461 × 10^{6}
100. TeV 1.000 × 10^{8} 3.517 111.489 154.818  57.843 327.667  1.529 × 10^{6}