Muons in air (dry, 1 atm)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.49919 & 1.205 × 10^{−3} & 85.7 & 0.10914 & 3.3994 & 1.7418 & 4.2759 & 10.5961 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.039  7.039  7.862 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.494  5.495  1.436 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.294  4.294  2.686 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.333  3.333  5.366 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.847  2.847  8.633 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.140  2.140  2.535 × 10^{1}
100. MeV 1.764 × 10^{2} 2.013  2.014  3.501 × 10^{1}
140. MeV 2.218 × 10^{2} 1.889  1.889  5.562 × 10^{1}
200. MeV 2.868 × 10^{2} 1.827  1.827  8.803 × 10^{1}
257. MeV 3.471 × 10^{2} 1.815  0.000  1.816 Minimum ionization
300. MeV 3.917 × 10^{2} 1.819  0.000  1.819  1.430 × 10^{2}
400. MeV 4.945 × 10^{2} 1.844  0.000  1.844  1.977 × 10^{2}
800. MeV 8.995 × 10^{2} 1.968  0.000  0.000  1.968  4.074 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.020  0.000  0.000  2.021  5.077 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.105  0.000  0.001  2.106  7.014 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.201  0.001  0.000  0.001  2.203  9.796 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.314  0.001  0.001  0.001  2.318  1.421 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.396  0.001  0.001  0.002  2.401  1.845 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.577  0.004  0.003  0.004  2.588  3.440 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.627  0.005  0.005  0.005  2.642  4.204 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.698  0.007  0.008  0.007  2.720  5.695 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.767  0.011  0.013  0.009  2.800  7.867 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.838  0.019  0.023  0.013  2.893  1.138 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.885  0.026  0.033  0.017  2.962  1.479 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.984  0.060  0.080  0.034  3.159  2.784 × 10^{4}
100. GeV 1.001 × 10^{5} 3.014  0.078  0.106  0.042  3.239  3.409 × 10^{4}
140. GeV 1.401 × 10^{5} 3.055  0.114  0.159  0.058  3.388  4.616 × 10^{4}
200. GeV 2.001 × 10^{5} 3.097  0.172  0.244  0.083  3.596  6.335 × 10^{4}
300. GeV 3.001 × 10^{5} 3.143  0.272  0.387  0.124  3.926  8.995 × 10^{4}
400. GeV 4.001 × 10^{5} 3.174  0.375  0.536  0.165  4.250  1.144 × 10^{5}
800. GeV 8.001 × 10^{5} 3.247  0.803  1.158  0.334  5.543  1.966 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.271  1.025  1.479  0.420  6.195  2.307 × 10^{5}
1.11 TeV 1.115 × 10^{6} 3.282  1.152  1.661  0.470  6.565 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.306  1.471  2.117  0.595  7.490  2.893 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.344  2.155  3.095  0.862  9.457  3.605 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.388  3.302  4.723  1.321  12.735  4.513 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.420  4.469  6.374  1.787  16.050  5.211 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.497  9.189  13.021  3.730  29.437  7.024 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.522  11.574  16.369  4.730  36.197  7.636 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.561  16.335  23.040  6.790  49.727  8.575 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.603  23.534  33.100  9.955  70.192  9.586 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.652  35.519  49.841  15.447 104.458  1.075 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.686  47.564  66.634  21.083 138.968  1.157 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.773  95.872 133.867  44.722 278.233  1.357 × 10^{6}
100. TeV 1.000 × 10^{8} 3.801 120.091 167.522  56.971 348.385  1.421 × 10^{6}