Muons in adipose tissue (ICRP)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.55947 & 0.920 & 63.2 & 0.10278 & 3.4817 & 0.1827 & 2.6530 & 3.2367 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 8.205  8.205  6.725 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.395  6.396  1.231 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.991  4.991  2.305 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.869  3.869  4.613 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.302  3.302  7.429 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.476  2.476  2.187 × 10^{1}
100. MeV 1.764 × 10^{2} 2.322  2.322  3.023 × 10^{1}
140. MeV 2.218 × 10^{2} 2.160  2.160  4.817 × 10^{1}
200. MeV 2.868 × 10^{2} 2.067  2.067  7.668 × 10^{1}
300. MeV 3.917 × 10^{2} 2.030  0.000  2.030  1.256 × 10^{2}
324. MeV 4.161 × 10^{2} 2.029  0.000  2.029 Minimum ionization
400. MeV 4.945 × 10^{2} 2.035  0.000  2.035  1.749 × 10^{2}
800. MeV 8.995 × 10^{2} 2.108  0.000  0.000  2.108  3.681 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.142  0.000  0.000  2.142  4.622 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.197  0.000  0.001  2.198  6.464 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.258  0.000  0.000  0.001  2.260  9.154 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.327  0.001  0.001  0.001  2.330  1.351 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.376  0.001  0.001  0.002  2.380  1.775 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.487  0.003  0.003  0.004  2.497  3.411 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.520  0.004  0.004  0.005  2.534  4.206 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.570  0.006  0.007  0.007  2.589  5.767 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.619  0.010  0.011  0.009  2.649  8.056 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.673  0.016  0.019  0.014  2.722  1.178 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.710  0.022  0.028  0.018  2.779  1.541 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.794  0.051  0.069  0.035  2.949  2.936 × 10^{4}
100. GeV 1.001 × 10^{5} 2.820  0.067  0.091  0.043  3.021  3.606 × 10^{4}
140. GeV 1.401 × 10^{5} 2.860  0.098  0.137  0.060  3.154  4.902 × 10^{4}
200. GeV 2.001 × 10^{5} 2.901  0.148  0.209  0.084  3.343  6.749 × 10^{4}
300. GeV 3.001 × 10^{5} 2.947  0.234  0.333  0.126  3.641  9.614 × 10^{4}
400. GeV 4.001 × 10^{5} 2.980  0.323  0.462  0.169  3.934  1.226 × 10^{5}
800. GeV 8.001 × 10^{5} 3.060  0.696  1.000  0.341  5.096  2.116 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.086  0.888  1.279  0.428  5.681  2.488 × 10^{5}
1.18 TeV 1.184 × 10^{6} 3.106  1.065  1.531  0.510  6.212 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.126  1.276  1.833  0.607  6.842  3.129 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.168  1.873  2.683  0.879  8.603  3.909 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.217  2.873  4.098  1.347  11.536  4.910 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.253  3.892  5.534  1.823  14.502  5.681 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.339  8.021  11.319  3.806  26.486  7.693 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.368  10.110  14.234  4.828  32.540  8.373 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.411  14.280  20.040  6.934  44.667  9.418 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.458  20.591  28.800  10.172  63.021  1.054 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.513  31.101  43.372  15.793  93.779  1.184 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.552  41.671  57.993  21.564 124.780  1.276 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.648  84.052 116.528  45.798 250.026  1.498 × 10^{6}
100. TeV 1.000 × 10^{8} 3.680 105.300 145.830  58.365 313.175  1.569 × 10^{6}