Muons in adenine (C_{5}H_{5}N_{5})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.51903 & 1.350 & 71.4 & 0.20908 & 3.0271 & 0.1295 & 2.4219 & 3.1724 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.495  7.495  7.371 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.845  5.845  1.348 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.564  4.564  2.523 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.540  3.540  5.046 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.022  3.022  8.123 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.264  2.264  2.389 × 10^{1}
100. MeV 1.764 × 10^{2} 2.119  2.120  3.305 × 10^{1}
140. MeV 2.218 × 10^{2} 1.972  1.972  5.271 × 10^{1}
200. MeV 2.868 × 10^{2} 1.887  1.887  8.393 × 10^{1}
300. MeV 3.917 × 10^{2} 1.854  0.000  1.855  1.375 × 10^{2}
318. MeV 4.105 × 10^{2} 1.854  0.000  1.854 Minimum ionization
400. MeV 4.945 × 10^{2} 1.860  0.000  1.860  1.914 × 10^{2}
800. MeV 8.995 × 10^{2} 1.929  0.000  0.000  1.930  4.027 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.961  0.000  0.000  1.962  5.055 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.013  0.000  0.001  2.014  7.066 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.070  0.001  0.000  0.001  2.072  1.000 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.135  0.001  0.001  0.001  2.138  1.475 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.180  0.001  0.001  0.002  2.184  1.937 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.283  0.003  0.003  0.004  2.293  3.719 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.314  0.004  0.004  0.005  2.328  4.584 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.360  0.006  0.007  0.007  2.380  6.283 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.406  0.010  0.011  0.009  2.436  8.773 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.455  0.016  0.020  0.013  2.505  1.282 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.489  0.023  0.029  0.018  2.560  1.676 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.568  0.053  0.071  0.034  2.727  3.188 × 10^{4}
100. GeV 1.001 × 10^{5} 2.592  0.069  0.094  0.042  2.798  3.912 × 10^{4}
140. GeV 1.401 × 10^{5} 2.628  0.102  0.142  0.059  2.931  5.308 × 10^{4}
200. GeV 2.001 × 10^{5} 2.666  0.154  0.217  0.084  3.121  7.291 × 10^{4}
300. GeV 3.001 × 10^{5} 2.709  0.242  0.345  0.125  3.422  1.035 × 10^{5}
400. GeV 4.001 × 10^{5} 2.740  0.335  0.479  0.167  3.720  1.315 × 10^{5}
800. GeV 8.001 × 10^{5} 2.814  0.719  1.035  0.338  4.905  2.248 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.838  0.917  1.322  0.424  5.502  2.633 × 10^{5}
1.06 TeV 1.064 × 10^{6} 2.845  0.980  1.413  0.452  5.691 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.875  1.317  1.895  0.602  6.689  3.292 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.915  1.931  2.772  0.871  8.490  4.086 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.960  2.961  4.233  1.335  11.490  5.095 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.993  4.009  5.715  1.806  14.524  5.868 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.073  8.254  11.683  3.771  26.781  7.865 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.100  10.400  14.690  4.783  32.973  8.537 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.140  14.683  20.680  6.867  45.371  9.567 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.184  21.163  29.715  10.071  64.133  1.067 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.234  31.952  44.748  15.632  95.566  1.194 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.270  42.798  59.831  21.340 127.240  1.285 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.360  86.287 120.213  45.297 255.156  1.502 × 10^{6}
100. TeV 1.000 × 10^{8} 3.389 108.087 150.440  57.716 319.633  1.572 × 10^{6}