Muons in actinium (Ac)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
89 (Ac) [227.02775(2)] 10.070  841.0 0.08567 3.2683 0.4559 3.7966 6.3742  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.774  3.774  1.544 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.015  3.015  2.740 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.405  2.405  4.991 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.904  1.904  9.723 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.646  1.646  1.541 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.268  1.268  4.390 × 10^{1}
100. MeV 1.764 × 10^{2} 1.202  1.202  6.014 × 10^{1}
140. MeV 2.218 × 10^{2} 1.140  1.140  9.445 × 10^{1}
200. MeV 2.868 × 10^{2} 1.113  1.113  1.479 × 10^{2}
219. MeV 3.074 × 10^{2} 1.112  0.000  1.112 Minimum ionization
300. MeV 3.917 × 10^{2} 1.121  0.000  0.000  1.122  2.376 × 10^{2}
400. MeV 4.945 × 10^{2} 1.144  0.000  0.000  1.144  3.259 × 10^{2}
800. MeV 8.995 × 10^{2} 1.231  0.001  0.000  1.232  6.621 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.264  0.002  0.000  1.266  8.221 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.317  0.003  0.001  1.320  1.131 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.374  0.004  0.001  0.001  1.380  1.575 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.437  0.007  0.003  0.001  1.450  2.281 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.481  0.011  0.006  0.002  1.500  2.959 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.579  0.027  0.023  0.003  1.632  5.504 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.609  0.035  0.032  0.004  1.681  6.711 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.651  0.054  0.053  0.005  1.764  9.033 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.693  0.084  0.088  0.007  1.873  1.233 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.737  0.138  0.155  0.011  2.041  1.744 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.766  0.195  0.229  0.014  2.205  2.215 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.831  0.442  0.555  0.027  2.856  3.805 × 10^{4}
100. GeV 1.001 × 10^{5} 1.851  0.572  0.731  0.034  3.189  4.467 × 10^{4}
134. GeV 1.337 × 10^{5} 1.876  0.796  1.034  0.045  3.753 Muon critical energy
140. GeV 1.401 × 10^{5} 1.880  0.840  1.093  0.048  3.862  5.606 × 10^{4}
200. GeV 2.001 × 10^{5} 1.909  1.259  1.668  0.068  4.905  6.982 × 10^{4}
300. GeV 3.001 × 10^{5} 1.942  1.973  2.627  0.101  6.645  8.729 × 10^{4}
400. GeV 4.001 × 10^{5} 1.965  2.710  3.621  0.135  8.434  1.006 × 10^{5}
800. GeV 8.001 × 10^{5} 2.021  5.753  7.697  0.273  15.747  1.348 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.040  7.315  9.781  0.344  19.481  1.462 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.067  10.443  13.937  0.486  26.936  1.636 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.097  15.225  20.279  0.703  38.307  1.822 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.132  23.203  30.816  1.075  57.227  2.034 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.156  31.282  41.464  1.452  76.356  2.185 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.217  63.835  84.258  3.015 153.327  2.547 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.237  80.230 105.766  3.817 192.052  2.664 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.268 112.930 148.684  5.461 269.345  2.839 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.301 162.250 213.332  7.980 385.865  3.024 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.339 244.356 320.882  12.330 579.909  3.234 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.366 326.736 428.679  16.780 774.563  3.382 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.434 656.686 860.159  35.347 1554.627  3.740 × 10^{5}
100. TeV 1.000 × 10^{8} 2.456 821.910 1076.090  44.930 1945.388  3.854 × 10^{5}