Muons in acetylene (CHCH)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.53768 & 1.097 × 10^{−3} & 58.2 & 0.12167 & 3.4277 & 1.6017 & 4.0074 & 9.8419 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.968  7.968  6.921 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.208  6.208  1.267 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.843  4.843  2.374 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.753  3.753  4.753 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.202  3.202  7.656 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.399  2.400  2.255 × 10^{1}
100. MeV 1.764 × 10^{2} 2.255  2.256  3.117 × 10^{1}
140. MeV 2.218 × 10^{2} 2.113  2.114  4.958 × 10^{1}
200. MeV 2.868 × 10^{2} 2.040  2.040  7.858 × 10^{1}
263. MeV 3.537 × 10^{2} 2.025  0.000  2.025 Minimum ionization
300. MeV 3.917 × 10^{2} 2.028  0.000  2.028  1.279 × 10^{2}
400. MeV 4.945 × 10^{2} 2.053  0.000  2.053  1.769 × 10^{2}
800. MeV 8.995 × 10^{2} 2.184  0.000  0.000  2.185  3.657 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.240  0.000  0.000  2.241  4.560 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.332  0.000  0.001  2.333  6.308 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.435  0.000  0.000  0.001  2.437  8.822 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.557  0.001  0.001  0.001  2.560  1.282 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.645  0.001  0.001  0.002  2.649  1.666 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.820  0.003  0.003  0.004  2.829  3.120 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.870  0.004  0.004  0.005  2.883  3.820 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.942  0.006  0.006  0.007  2.961  5.188 × 10^{3}
20.0 GeV 2.011 × 10^{4} 3.011  0.009  0.010  0.009  3.040  7.186 × 10^{3}
30.0 GeV 3.011 × 10^{4} 3.082  0.015  0.018  0.014  3.130  1.042 × 10^{4}
40.0 GeV 4.011 × 10^{4} 3.129  0.021  0.027  0.018  3.195  1.359 × 10^{4}
80.0 GeV 8.011 × 10^{4} 3.229  0.049  0.065  0.035  3.378  2.574 × 10^{4}
100. GeV 1.001 × 10^{5} 3.258  0.063  0.086  0.043  3.451  3.159 × 10^{4}
140. GeV 1.401 × 10^{5} 3.300  0.093  0.130  0.059  3.583  4.297 × 10^{4}
200. GeV 2.001 × 10^{5} 3.343  0.141  0.199  0.084  3.767  5.929 × 10^{4}
300. GeV 3.001 × 10^{5} 3.390  0.222  0.316  0.126  4.055  8.486 × 10^{4}
400. GeV 4.001 × 10^{5} 3.422  0.307  0.439  0.168  4.337  1.087 × 10^{5}
800. GeV 8.001 × 10^{5} 3.500  0.661  0.951  0.340  5.452  1.908 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.525  0.844  1.216  0.428  6.012  2.257 × 10^{5}
1.40 TeV 1.400 × 10^{6} 3.563  1.212  1.743  0.606  7.125  2.867 × 10^{5}
1.40 TeV 1.400 × 10^{6} 3.563  1.213  1.744  0.607  7.126 Muon critical energy
2.00 TeV 2.000 × 10^{6} 3.604  1.779  2.552  0.878  8.814  3.623 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.651  2.730  3.899  1.346  11.626  4.608 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.685  3.698  5.266  1.822  14.471  5.378 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.768  7.621  10.772  3.804  25.966  7.413 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.796  9.606  13.547  4.825  31.774  8.108 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.838  13.568  19.074  6.931  43.410  9.181 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.883  19.563  27.412  10.166  61.024  1.034 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.935  29.546  41.284  15.784  90.549  1.168 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.972  39.586  55.203  21.551 120.312  1.263 × 10^{6}
80.0 TeV 8.000 × 10^{7} 4.065  79.826 110.926  45.767 240.583  1.494 × 10^{6}
100. TeV 1.000 × 10^{8} 4.096  99.994 138.821  58.325 301.236  1.568 × 10^{6}