Muons in acetone (CH_{3}COCH_{3})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.55097 & 0.790 & 64.2 & 0.11100 & 3.4047 & 0.2197 & 2.6928 & 3.4341 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 8.065  8.065  6.843 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.286  6.286  1.252 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.906  4.906  2.345 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.803  3.803  4.693 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.246  3.246  7.557 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.434  2.434  2.224 × 10^{1}
100. MeV 1.764 × 10^{2} 2.288  2.288  3.074 × 10^{1}
140. MeV 2.218 × 10^{2} 2.130  2.130  4.894 × 10^{1}
200. MeV 2.868 × 10^{2} 2.039  2.039  7.784 × 10^{1}
300. MeV 3.917 × 10^{2} 2.003  0.000  2.004  1.275 × 10^{2}
318. MeV 4.105 × 10^{2} 2.003  0.000  2.003 Minimum ionization
400. MeV 4.945 × 10^{2} 2.009  0.000  2.009  1.774 × 10^{2}
800. MeV 8.995 × 10^{2} 2.083  0.000  0.000  2.083  3.729 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.117  0.000  0.000  2.118  4.681 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.172  0.000  0.001  2.173  6.545 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.233  0.001  0.000  0.001  2.235  9.265 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.303  0.001  0.001  0.001  2.306  1.366 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.351  0.001  0.001  0.002  2.356  1.795 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.462  0.003  0.003  0.004  2.472  3.448 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.495  0.004  0.004  0.005  2.509  4.251 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.544  0.006  0.007  0.007  2.564  5.827 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.593  0.010  0.011  0.009  2.624  8.139 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.646  0.016  0.020  0.014  2.696  1.190 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.683  0.023  0.029  0.018  2.752  1.557 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.766  0.052  0.070  0.035  2.922  2.965 × 10^{4}
100. GeV 1.001 × 10^{5} 2.792  0.067  0.092  0.043  2.994  3.641 × 10^{4}
140. GeV 1.401 × 10^{5} 2.830  0.100  0.138  0.059  3.128  4.947 × 10^{4}
200. GeV 2.001 × 10^{5} 2.871  0.150  0.212  0.084  3.317  6.809 × 10^{4}
300. GeV 3.001 × 10^{5} 2.916  0.237  0.337  0.126  3.617  9.695 × 10^{4}
400. GeV 4.001 × 10^{5} 2.949  0.327  0.468  0.168  3.913  1.235 × 10^{5}
800. GeV 8.001 × 10^{5} 3.028  0.704  1.013  0.340  5.085  2.129 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.053  0.899  1.295  0.427  5.674  2.502 × 10^{5}
1.16 TeV 1.160 × 10^{6} 3.070  1.055  1.518  0.498  6.141 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.092  1.292  1.856  0.606  6.845  3.142 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.134  1.895  2.716  0.877  8.622  3.922 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.182  2.907  4.148  1.344  11.582  4.919 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.217  3.938  5.601  1.819  14.576  5.687 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.303  8.112  11.455  3.798  26.669  7.687 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.331  10.225  14.404  4.818  32.778  8.362 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.374  14.441  20.280  6.919  45.014  9.399 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.420  20.821  29.143  10.149  63.532  1.052 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.473  31.445  43.888  15.757  94.563  1.180 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.512  42.128  58.682  21.513 125.836  1.271 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.607  84.965 117.910  45.684 252.166  1.491 × 10^{6}
100. TeV 1.000 × 10^{8} 3.638 106.440 147.560  58.218 315.857  1.562 × 10^{6}