Muons in a-150 tissue-equivalent plastic

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.54903 & 1.127 & 65.1 & 0.10783 & 3.4442 & 0.1329 & 2.6234 & 3.1100 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 8.022  8.022  6.880 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.253  6.253  1.259 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.881  4.881  2.357 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.784  3.784  4.717 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.230  3.230  7.596 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.418  2.418  2.236 × 10^{1}
100. MeV 1.764 × 10^{2} 2.264  2.264  3.093 × 10^{1}
140. MeV 2.218 × 10^{2} 2.106  2.106  4.933 × 10^{1}
200. MeV 2.868 × 10^{2} 2.015  2.015  7.857 × 10^{1}
300. MeV 3.917 × 10^{2} 1.978  0.000  1.979  1.288 × 10^{2}
324. MeV 4.161 × 10^{2} 1.978  0.000  1.978 Minimum ionization
400. MeV 4.945 × 10^{2} 1.983  0.000  1.983  1.793 × 10^{2}
800. MeV 8.995 × 10^{2} 2.054  0.000  0.000  2.055  3.776 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.087  0.000  0.000  2.088  4.741 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.141  0.000  0.001  2.142  6.631 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.201  0.000  0.000  0.001  2.203  9.391 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.269  0.001  0.001  0.001  2.272  1.386 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.316  0.001  0.001  0.002  2.320  1.821 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.425  0.003  0.003  0.004  2.435  3.499 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.458  0.004  0.004  0.005  2.471  4.314 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.506  0.006  0.007  0.007  2.526  5.914 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.555  0.010  0.011  0.009  2.585  8.261 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.607  0.016  0.019  0.014  2.656  1.207 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.643  0.022  0.028  0.018  2.712  1.580 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.726  0.051  0.069  0.035  2.881  3.008 × 10^{4}
100. GeV 1.001 × 10^{5} 2.752  0.066  0.091  0.043  2.952  3.694 × 10^{4}
140. GeV 1.401 × 10^{5} 2.791  0.098  0.136  0.059  3.085  5.019 × 10^{4}
200. GeV 2.001 × 10^{5} 2.831  0.148  0.209  0.084  3.272  6.907 × 10^{4}
300. GeV 3.001 × 10^{5} 2.876  0.234  0.332  0.126  3.569  9.832 × 10^{4}
400. GeV 4.001 × 10^{5} 2.909  0.323  0.461  0.168  3.861  1.252 × 10^{5}
800. GeV 8.001 × 10^{5} 2.987  0.694  0.998  0.340  5.019  2.158 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.013  0.886  1.276  0.427  5.602  2.535 × 10^{5}
1.16 TeV 1.159 × 10^{6} 3.030  1.038  1.494  0.498  6.060 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.052  1.273  1.828  0.606  6.759  3.185 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.093  1.867  2.676  0.878  8.515  3.974 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.142  2.865  4.088  1.346  11.440  4.984 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.176  3.880  5.520  1.821  14.398  5.761 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.261  7.995  11.290  3.803  26.350  7.785 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.289  10.077  14.197  4.824  32.387  8.468 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.332  14.232  19.988  6.928  44.481  9.518 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.378  20.520  28.725  10.162  62.785  1.065 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.431  30.991  43.259  15.777  93.459  1.195 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.470  41.521  57.841  21.542 124.374  1.287 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.564  83.733 116.221  45.750 249.269  1.510 × 10^{6}
100. TeV 1.000 × 10^{8} 3.596 104.894 145.447  58.303 312.240  1.581 × 10^{6}