Muons in Freon-13i1 (CF_{3}I)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.43997 & 1.800 & 293.5 & 0.09112 & 3.1658 & 0.2847 & 3.7280 & 5.8774 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.199  5.199  1.080 × 10^{0}
14.0 MeV 5.616 × 10^{1} 4.088  4.088  1.956 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.217  3.217  3.629 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.515  2.515  7.193 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.159  2.159  1.151 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.640  1.640  3.343 × 10^{1}
100. MeV 1.764 × 10^{2} 1.549  1.549  4.601 × 10^{1}
140. MeV 2.218 × 10^{2} 1.460  1.460  7.272 × 10^{1}
200. MeV 2.868 × 10^{2} 1.414  1.414  1.146 × 10^{2}
257. MeV 3.471 × 10^{2} 1.406  0.000  1.407 Minimum ionization
300. MeV 3.917 × 10^{2} 1.409  0.000  0.000  1.409  1.856 × 10^{2}
400. MeV 4.945 × 10^{2} 1.427  0.000  0.000  1.427  2.562 × 10^{2}
800. MeV 8.995 × 10^{2} 1.513  0.001  0.000  1.514  5.281 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.548  0.001  0.000  1.549  6.586 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.603  0.001  0.000  0.001  1.606  9.120 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.664  0.002  0.001  0.001  1.668  1.278 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.732  0.004  0.002  0.001  1.740  1.865 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.779  0.005  0.004  0.002  1.791  2.431 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.887  0.013  0.013  0.003  1.916  4.582 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.919  0.017  0.018  0.004  1.958  5.614 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.965  0.026  0.028  0.006  2.026  7.621 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.011  0.041  0.046  0.008  2.107  1.052 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.060  0.066  0.081  0.012  2.220  1.514 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.092  0.094  0.119  0.016  2.321  1.955 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.165  0.212  0.285  0.031  2.693  3.552 × 10^{4}
100. GeV 1.001 × 10^{5} 2.186  0.275  0.375  0.038  2.875  4.270 × 10^{4}
140. GeV 1.401 × 10^{5} 2.218  0.404  0.559  0.053  3.235  5.581 × 10^{4}
200. GeV 2.001 × 10^{5} 2.251  0.606  0.852  0.075  3.785  7.295 × 10^{4}
286. GeV 2.865 × 10^{5} 2.284  0.903  1.274  0.107  4.569 Muon critical energy
300. GeV 3.001 × 10^{5} 2.288  0.951  1.342  0.112  4.694  9.663 × 10^{4}
400. GeV 4.001 × 10^{5} 2.314  1.307  1.850  0.150  5.622  1.161 × 10^{5}
800. GeV 8.001 × 10^{5} 2.377  2.781  3.935  0.303  9.398  1.705 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.398  3.539  5.003  0.381  11.322  1.899 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.429  5.058  7.133  0.539  15.161  2.203 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.462  7.383  10.384  0.781  21.011  2.538 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.501  11.265  15.788  1.194  30.750  2.929 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.529  15.201  21.252  1.615  40.597  3.212 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.597  31.076  43.217  3.360  80.251  3.899 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.619  39.078  54.260  4.257 100.216  4.122 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.654  55.040  76.293  6.101 140.088  4.458 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.691  79.129 109.486  8.928 200.235  4.814 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.733 119.233 164.713  13.821 300.502  5.219 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.764 159.487 220.076  18.834 401.162  5.506 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.840 320.761 441.685  39.792 805.079  6.196 × 10^{5}
100. TeV 1.000 × 10^{8} 2.865 401.541 552.594  50.629 1007.630  6.418 × 10^{5}