Muons in Freon-13b1 (CF_{3}Br)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.45665 & 1.500 & 210.5 & 0.03925 & 3.7194 & 0.3522 & 3.7554 & 5.3555 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.678  5.678  9.844 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.454  4.454  1.788 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.498  3.498  3.325 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.729  2.729  6.606 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.339  2.339  1.059 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.771  1.771  3.086 × 10^{1}
100. MeV 1.764 × 10^{2} 1.671  1.671  4.251 × 10^{1}
140. MeV 2.218 × 10^{2} 1.574  1.574  6.729 × 10^{1}
200. MeV 2.868 × 10^{2} 1.524  1.524  1.062 × 10^{2}
266. MeV 3.567 × 10^{2} 1.513  0.000  1.513 Minimum ionization
300. MeV 3.917 × 10^{2} 1.515  0.000  1.515  1.721 × 10^{2}
400. MeV 4.945 × 10^{2} 1.531  0.000  0.000  1.532  2.378 × 10^{2}
800. MeV 8.995 × 10^{2} 1.616  0.000  0.000  1.616  4.919 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.650  0.001  0.000  1.651  6.142 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.705  0.001  0.000  0.001  1.707  8.523 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.765  0.001  0.001  0.001  1.768  1.197 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.833  0.002  0.002  0.001  1.838  1.751 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.879  0.004  0.003  0.002  1.887  2.288 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.984  0.009  0.009  0.004  2.005  4.336 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.016  0.012  0.012  0.004  2.044  5.324 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.061  0.018  0.019  0.006  2.104  7.251 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.106  0.027  0.032  0.008  2.174  1.005 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.154  0.045  0.055  0.012  2.267  1.455 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.187  0.063  0.081  0.016  2.347  1.889 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.259  0.143  0.194  0.032  2.628  3.496 × 10^{4}
100. GeV 1.001 × 10^{5} 2.281  0.185  0.256  0.039  2.761  4.239 × 10^{4}
140. GeV 1.401 × 10^{5} 2.313  0.272  0.382  0.055  3.023  5.623 × 10^{4}
200. GeV 2.001 × 10^{5} 2.347  0.408  0.582  0.078  3.416  7.489 × 10^{4}
300. GeV 3.001 × 10^{5} 2.385  0.641  0.918  0.116  4.061  1.017 × 10^{5}
400. GeV 4.001 × 10^{5} 2.412  0.882  1.267  0.155  4.717  1.245 × 10^{5}
418. GeV 4.177 × 10^{5} 2.416  0.925  1.329  0.162  4.833 Muon critical energy
800. GeV 8.001 × 10^{5} 2.478  1.880  2.702  0.314  7.373  1.918 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.499  2.393  3.438  0.394  8.724  2.167 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.531  3.424  4.905  0.559  11.419  2.567 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.566  5.002  7.147  0.809  15.524  3.016 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.606  7.640  10.874  1.238  22.358  3.550 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.635  10.317  14.644  1.674  29.270  3.940 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.706  21.120  29.807  3.486  57.120  4.901 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.729  26.570  37.433  4.418  71.151  5.214 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.764  37.441  52.645  6.334  99.185  5.688 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.803  53.855  75.567  9.275 141.501  6.192 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.847  81.181 113.708  14.368 212.105  6.765 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.879 108.618 151.949  19.587 283.035  7.172 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.958 218.569 305.033  41.431 567.991  8.150 × 10^{5}
100. TeV 1.000 × 10^{8} 2.983 273.654 381.653  52.731 711.022  8.464 × 10^{5}