Muons in Freon-13 (CF_3Cl)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.47966 0.950 126.6 0.07238 3.5551 0.3659 3.2337 4.7483 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 6.416 6.416 8.659 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.019 5.019 1.578 × 10^0 20.0 MeV 6.802 × 10^1 3.930 3.930 2.945 × 10^0 30.0 MeV 8.509 × 10^1 3.057 3.057 5.870 × 10^0 40.0 MeV 1.003 × 10^2 2.615 2.615 9.430 × 10^0 80.0 MeV 1.527 × 10^2 1.971 1.971 2.760 × 10^1 100. MeV 1.764 × 10^2 1.857 1.857 3.809 × 10^1 140. MeV 2.218 × 10^2 1.745 1.745 6.041 × 10^1 200. MeV 2.868 × 10^2 1.685 1.685 9.551 × 10^1 283. MeV 3.738 × 10^2 1.668 0.000 1.668 Minimum ionization 300. MeV 3.917 × 10^2 1.668 0.000 1.668 1.553 × 10^2 400. MeV 4.945 × 10^2 1.681 0.000 1.681 2.151 × 10^2 800. MeV 8.995 × 10^2 1.762 0.000 0.000 1.763 4.473 × 10^2 1.00 GeV 1.101 × 10^3 1.796 0.000 0.000 1.797 5.596 × 10^2 1.40 GeV 1.502 × 10^3 1.851 0.001 0.000 0.001 1.853 7.787 × 10^2 2.00 GeV 2.103 × 10^3 1.911 0.001 0.000 0.001 1.913 1.097 × 10^3 3.00 GeV 3.104 × 10^3 1.978 0.001 0.001 0.001 1.982 1.610 × 10^3 4.00 GeV 4.104 × 10^3 2.024 0.002 0.002 0.002 2.030 2.108 × 10^3 8.00 GeV 8.105 × 10^3 2.129 0.005 0.005 0.004 2.142 4.020 × 10^3 10.0 GeV 1.011 × 10^4 2.160 0.007 0.007 0.005 2.178 4.946 × 10^3 14.0 GeV 1.411 × 10^4 2.205 0.010 0.011 0.006 2.233 6.758 × 10^3 20.0 GeV 2.011 × 10^4 2.250 0.016 0.018 0.009 2.294 9.408 × 10^3 30.0 GeV 3.011 × 10^4 2.299 0.026 0.032 0.013 2.370 1.369 × 10^4 40.0 GeV 4.011 × 10^4 2.331 0.037 0.047 0.017 2.432 1.786 × 10^4 80.0 GeV 8.011 × 10^4 2.404 0.083 0.113 0.033 2.634 3.364 × 10^4 100. GeV 1.001 × 10^5 2.427 0.108 0.149 0.041 2.725 4.110 × 10^4 140. GeV 1.401 × 10^5 2.461 0.159 0.223 0.057 2.899 5.533 × 10^4 200. GeV 2.001 × 10^5 2.496 0.239 0.340 0.081 3.156 7.515 × 10^4 300. GeV 3.001 × 10^5 2.536 0.376 0.539 0.121 3.571 1.049 × 10^5 400. GeV 4.001 × 10^5 2.564 0.518 0.745 0.161 3.988 1.314 × 10^5 699. GeV 6.990 × 10^5 2.619 0.956 1.379 0.284 5.239 Muon critical energy 800. GeV 8.001 × 10^5 2.633 1.107 1.598 0.326 5.664 2.151 × 10^5 1.00 TeV 1.000 × 10^6 2.655 1.411 2.038 0.410 6.514 2.481 × 10^5 1.40 TeV 1.400 × 10^6 2.689 2.022 2.913 0.581 8.205 3.027 × 10^5 2.00 TeV 2.000 × 10^6 2.725 2.959 4.252 0.841 10.778 3.663 × 10^5 3.00 TeV 3.000 × 10^6 2.767 4.528 6.479 1.288 15.063 4.444 × 10^5 4.00 TeV 4.000 × 10^6 2.798 6.122 8.735 1.743 19.397 5.028 × 10^5 8.00 TeV 8.000 × 10^6 2.872 12.564 17.815 3.633 36.885 6.498 × 10^5 10.0 TeV 1.000 × 10^7 2.896 15.817 22.385 4.606 45.705 6.985 × 10^5 14.0 TeV 1.400 × 10^7 2.934 22.310 31.494 6.609 63.347 7.725 × 10^5 20.0 TeV 2.000 × 10^7 2.974 32.124 45.226 9.683 90.007 8.516 × 10^5 30.0 TeV 3.000 × 10^7 3.021 48.452 68.081 15.014 134.568 9.418 × 10^5 40.0 TeV 4.000 × 10^7 3.054 64.854 91.005 20.482 179.395 1.006 × 10^6 80.0 TeV 8.000 × 10^7 3.137 130.615 182.773 43.392 359.916 1.160 × 10^6 100. TeV 1.000 × 10^8 3.164 163.575 228.707 55.254 450.700 1.210 × 10^6