Muons in Freon-13 (CF_{3}Cl)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.47966 & 0.950 & 126.6 & 0.07238 & 3.5551 & 0.3659 & 3.2337 & 4.7483 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.416  6.416  8.659 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.019  5.019  1.578 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.930  3.930  2.945 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.057  3.057  5.870 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.615  2.615  9.430 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.971  1.971  2.760 × 10^{1}
100. MeV 1.764 × 10^{2} 1.857  1.857  3.809 × 10^{1}
140. MeV 2.218 × 10^{2} 1.745  1.745  6.041 × 10^{1}
200. MeV 2.868 × 10^{2} 1.685  1.685  9.551 × 10^{1}
283. MeV 3.738 × 10^{2} 1.668  0.000  1.668 Minimum ionization
300. MeV 3.917 × 10^{2} 1.668  0.000  1.668  1.553 × 10^{2}
400. MeV 4.945 × 10^{2} 1.681  0.000  1.681  2.151 × 10^{2}
800. MeV 8.995 × 10^{2} 1.762  0.000  0.000  1.763  4.473 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.796  0.000  0.000  1.797  5.596 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.851  0.001  0.000  0.001  1.853  7.787 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.911  0.001  0.000  0.001  1.913  1.097 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.978  0.001  0.001  0.001  1.982  1.610 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.024  0.002  0.002  0.002  2.030  2.108 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.129  0.005  0.005  0.004  2.142  4.020 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.160  0.007  0.007  0.005  2.178  4.946 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.205  0.010  0.011  0.006  2.233  6.758 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.250  0.016  0.018  0.009  2.294  9.408 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.299  0.026  0.032  0.013  2.370  1.369 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.331  0.037  0.047  0.017  2.432  1.786 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.404  0.083  0.113  0.033  2.634  3.364 × 10^{4}
100. GeV 1.001 × 10^{5} 2.427  0.108  0.149  0.041  2.725  4.110 × 10^{4}
140. GeV 1.401 × 10^{5} 2.461  0.159  0.223  0.057  2.899  5.533 × 10^{4}
200. GeV 2.001 × 10^{5} 2.496  0.239  0.340  0.081  3.156  7.515 × 10^{4}
300. GeV 3.001 × 10^{5} 2.536  0.376  0.539  0.121  3.571  1.049 × 10^{5}
400. GeV 4.001 × 10^{5} 2.564  0.518  0.745  0.161  3.988  1.314 × 10^{5}
699. GeV 6.990 × 10^{5} 2.619  0.956  1.379  0.284  5.239 Muon critical energy
800. GeV 8.001 × 10^{5} 2.633  1.107  1.598  0.326  5.664  2.151 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.655  1.411  2.038  0.410  6.514  2.481 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.689  2.022  2.913  0.581  8.205  3.027 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.725  2.959  4.252  0.841  10.778  3.663 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.767  4.528  6.479  1.288  15.063  4.444 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.798  6.122  8.735  1.743  19.397  5.028 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.872  12.564  17.815  3.633  36.885  6.498 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.896  15.817  22.385  4.606  45.705  6.985 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.934  22.310  31.494  6.609  63.347  7.725 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.974  32.124  45.226  9.683  90.007  8.516 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.021  48.452  68.081  15.014 134.568  9.418 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.054  64.854  91.005  20.482 179.395  1.006 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.137 130.615 182.773  43.392 359.916  1.160 × 10^{6}
100. TeV 1.000 × 10^{8} 3.164 163.575 228.707  55.254 450.700  1.210 × 10^{6}