Muons in Freon-12B2 (CF_{2}Br_{2})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.44901 & 1.800 & 284.9 & 0.05144 & 3.5565 & 0.3406 & 3.7956 & 5.7976 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.330  5.330  1.053 × 10^{0}
14.0 MeV 5.616 × 10^{1} 4.190  4.190  1.908 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.297  3.297  3.540 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.577  2.577  7.017 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.212  2.212  1.123 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.680  1.680  3.263 × 10^{1}
100. MeV 1.764 × 10^{2} 1.586  1.586  4.491 × 10^{1}
140. MeV 2.218 × 10^{2} 1.496  1.496  7.099 × 10^{1}
200. MeV 2.868 × 10^{2} 1.452  1.452  1.118 × 10^{2}
252. MeV 3.421 × 10^{2} 1.445  0.000  1.445 Minimum ionization
300. MeV 3.917 × 10^{2} 1.448  0.000  1.449  1.809 × 10^{2}
400. MeV 4.945 × 10^{2} 1.467  0.000  0.000  1.468  2.496 × 10^{2}
800. MeV 8.995 × 10^{2} 1.556  0.000  0.000  1.557  5.139 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.592  0.001  0.000  1.593  6.409 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.648  0.001  0.000  0.001  1.650  8.874 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.709  0.002  0.001  0.001  1.713  1.244 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.778  0.003  0.002  0.001  1.784  1.815 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.825  0.004  0.003  0.002  1.835  2.367 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.932  0.011  0.011  0.003  1.957  4.470 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.964  0.014  0.015  0.004  1.998  5.481 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.010  0.022  0.024  0.006  2.062  7.451 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.056  0.034  0.039  0.008  2.137  1.031 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.104  0.055  0.068  0.012  2.240  1.487 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.137  0.078  0.100  0.016  2.330  1.925 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.209  0.175  0.239  0.031  2.655  3.530 × 10^{4}
100. GeV 1.001 × 10^{5} 2.231  0.227  0.314  0.038  2.811  4.262 × 10^{4}
140. GeV 1.401 × 10^{5} 2.263  0.334  0.469  0.053  3.120  5.612 × 10^{4}
200. GeV 2.001 × 10^{5} 2.297  0.501  0.715  0.076  3.589  7.404 × 10^{4}
300. GeV 3.001 × 10^{5} 2.334  0.786  1.127  0.114  4.361  9.929 × 10^{4}
342. GeV 3.425 × 10^{5} 2.346  0.910  1.306  0.130  4.693 Muon critical energy
400. GeV 4.001 × 10^{5} 2.361  1.082  1.553  0.152  5.148  1.204 × 10^{5}
800. GeV 8.001 × 10^{5} 2.425  2.303  3.307  0.307  8.343  1.808 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.446  2.931  4.206  0.385  9.969  2.028 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.478  4.192  5.999  0.546  13.215  2.375 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.512  6.121  8.737  0.790  18.161  2.761 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.551  9.346  13.288  1.209  26.395  3.215 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.579  12.616  17.890  1.635  34.721  3.545 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.649  25.812  36.397  3.402  68.262  4.351 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.672  32.467  45.704  4.311  85.154  4.613 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.707  45.741  64.269  6.178 118.896  5.008 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.744  65.779  92.243  9.042 169.809  5.429 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.788  99.138 138.788  13.998 254.713  5.906 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.819 132.629 185.450  19.075 339.975  6.245 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.897 266.826 372.245  40.306 682.275  7.059 × 10^{5}
100. TeV 1.000 × 10^{8} 2.922 334.053 465.736  51.283 853.995  7.320 × 10^{5}