Muons in Freon-12 (CF_{2}Cl_{2})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.47969 & 1.120 & 143.0 & 0.07978 & 3.4626 & 0.3035 & 3.2659 & 4.8251 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.308  6.308  8.819 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.938  4.938  1.606 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.869  3.869  2.994 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.011  3.011  5.965 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.577  2.577  9.578 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.945  1.945  2.801 × 10^{1}
100. MeV 1.764 × 10^{2} 1.832  1.832  3.863 × 10^{1}
140. MeV 2.218 × 10^{2} 1.722  1.722  6.124 × 10^{1}
200. MeV 2.868 × 10^{2} 1.661  1.661  9.685 × 10^{1}
277. MeV 3.683 × 10^{2} 1.645  0.000  1.645 Minimum ionization
300. MeV 3.917 × 10^{2} 1.646  0.000  1.646  1.575 × 10^{2}
400. MeV 4.945 × 10^{2} 1.660  0.000  1.660  2.180 × 10^{2}
800. MeV 8.995 × 10^{2} 1.742  0.000  0.000  1.743  4.531 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.777  0.000  0.000  1.778  5.666 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.833  0.001  0.000  0.001  1.834  7.880 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.893  0.001  0.000  0.001  1.895  1.109 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.961  0.002  0.001  0.001  1.965  1.627 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.008  0.002  0.002  0.002  2.014  2.129 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.114  0.006  0.006  0.004  2.129  4.054 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.146  0.008  0.008  0.005  2.166  4.985 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.191  0.012  0.013  0.006  2.223  6.807 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.237  0.018  0.021  0.009  2.286  9.467 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.286  0.030  0.037  0.013  2.366  1.376 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.318  0.043  0.054  0.017  2.433  1.793 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.392  0.097  0.131  0.033  2.653  3.365 × 10^{4}
100. GeV 1.001 × 10^{5} 2.415  0.125  0.172  0.040  2.753  4.105 × 10^{4}
140. GeV 1.401 × 10^{5} 2.448  0.184  0.258  0.056  2.948  5.509 × 10^{4}
200. GeV 2.001 × 10^{5} 2.484  0.276  0.394  0.080  3.235  7.451 × 10^{4}
300. GeV 3.001 × 10^{5} 2.524  0.435  0.624  0.120  3.702  1.034 × 10^{5}
400. GeV 4.001 × 10^{5} 2.552  0.599  0.862  0.160  4.173  1.288 × 10^{5}
615. GeV 6.149 × 10^{5} 2.594  0.961  1.387  0.247  5.189 Muon critical energy
800. GeV 8.001 × 10^{5} 2.620  1.279  1.846  0.323  6.069  2.078 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.643  1.630  2.352  0.406  7.031  2.384 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.677  2.334  3.361  0.575  8.948  2.888 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.713  3.415  4.904  0.833  11.866  3.468 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.755  5.223  7.470  1.275  16.724  4.175 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.785  7.059  10.068  1.725  21.638  4.699 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.860  14.477  20.523  3.595  41.456  6.012 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.884  18.223  25.784  4.557  51.449  6.444 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.922  25.700  36.271  6.537  71.430  7.101 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.962  36.998  52.078  9.576 101.615  7.802 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.008  55.790  78.391  14.844 152.034  8.601 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.042  74.665 104.781  20.245 202.733  9.169 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.125 150.337 210.418  42.867 406.747  1.053 × 10^{6}
100. TeV 1.000 × 10^{8} 3.152 188.263 263.293  54.577 509.285  1.097 × 10^{6}