Muons in C-552 air-equivalent plastic

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.49969 & 1.760 & 86.8 & 0.10492 & 3.4344 & 0.1510 & 2.7083 & 3.3338 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.034  7.034  7.867 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.491  5.491  1.437 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.291  4.291  2.687 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.332  3.332  5.369 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.846  2.846  8.638 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.138  2.138  2.536 × 10^{1}
100. MeV 1.764 × 10^{2} 2.004  2.004  3.505 × 10^{1}
140. MeV 2.218 × 10^{2} 1.867  1.867  5.583 × 10^{1}
200. MeV 2.868 × 10^{2} 1.789  1.789  8.878 × 10^{1}
300. MeV 3.917 × 10^{2} 1.760  0.000  1.760  1.453 × 10^{2}
313. MeV 4.055 × 10^{2} 1.760  0.000  1.760 Minimum ionization
400. MeV 4.945 × 10^{2} 1.766  0.000  1.767  2.020 × 10^{2}
800. MeV 8.995 × 10^{2} 1.835  0.000  0.000  1.835  4.242 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.866  0.000  0.000  1.867  5.323 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.916  0.000  0.001  1.917  7.436 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.972  0.001  0.000  0.001  1.974  1.052 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.035  0.001  0.001  0.001  2.038  1.550 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.079  0.001  0.001  0.002  2.083  2.035 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.179  0.003  0.003  0.004  2.190  3.902 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.209  0.005  0.005  0.005  2.223  4.808 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.253  0.007  0.008  0.007  2.275  6.586 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.298  0.011  0.013  0.009  2.331  9.190 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.346  0.018  0.022  0.013  2.400  1.342 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.379  0.026  0.032  0.017  2.454  1.753 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.454  0.058  0.078  0.034  2.625  3.327 × 10^{4}
100. GeV 1.001 × 10^{5} 2.478  0.075  0.103  0.042  2.699  4.078 × 10^{4}
140. GeV 1.401 × 10^{5} 2.513  0.111  0.155  0.058  2.837  5.523 × 10^{4}
200. GeV 2.001 × 10^{5} 2.549  0.167  0.237  0.083  3.037  7.567 × 10^{4}
300. GeV 3.001 × 10^{5} 2.591  0.264  0.376  0.124  3.355  1.070 × 10^{5}
400. GeV 4.001 × 10^{5} 2.620  0.364  0.521  0.165  3.671  1.355 × 10^{5}
800. GeV 8.001 × 10^{5} 2.692  0.781  1.125  0.334  4.933  2.291 × 10^{5}
953. GeV 9.536 × 10^{5} 2.710  0.945  1.364  0.400  5.421 Muon critical energy
1.00 TeV 1.000 × 10^{6} 2.715  0.996  1.438  0.420  5.569  2.673 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.751  1.429  2.058  0.596  6.834  3.320 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.788  2.095  3.010  0.863  8.756  4.094 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.832  3.210  4.593  1.323  11.959  5.067 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.864  4.345  6.199  1.790  15.197  5.807 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.941  8.937  12.664  3.735  28.277  7.707 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.967  11.258  15.920  4.737  34.882  8.343 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.006  15.890  22.409  6.800  48.105  9.315 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.048  22.895  32.195  9.970  68.107  1.036 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.096  34.558  48.478  15.470 101.603  1.155 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.131  46.282  64.813  21.115 135.341  1.240 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.217  93.278 130.210  44.797 271.502  1.445 × 10^{6}
100. TeV 1.000 × 10^{8} 3.246 116.833 162.947  57.070 340.096  1.511 × 10^{6}