Muons in 1,2-dichloroethane C_{2}H_{4}C_{12}

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.50526 & 1.235 & 111.9 & 0.13383 & 3.1675 & 0.1375 & 2.9529 & 4.1849 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.875  6.875  8.071 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.373  5.373  1.472 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.205  4.205  2.749 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.268  3.269  5.484 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.795  2.795  8.814 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.103  2.103  2.583 × 10^{1}
100. MeV 1.764 × 10^{2} 1.975  1.975  3.567 × 10^{1}
140. MeV 2.218 × 10^{2} 1.846  1.846  5.671 × 10^{1}
200. MeV 2.868 × 10^{2} 1.775  1.775  8.999 × 10^{1}
293. MeV 3.844 × 10^{2} 1.753  0.000  1.753 Minimum ionization
300. MeV 3.917 × 10^{2} 1.753  0.000  1.753  1.468 × 10^{2}
400. MeV 4.945 × 10^{2} 1.764  0.000  1.764  2.038 × 10^{2}
800. MeV 8.995 × 10^{2} 1.844  0.000  0.000  1.845  4.255 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.879  0.000  0.000  1.879  5.329 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.934  0.001  0.000  0.001  1.936  7.424 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.996  0.001  0.000  0.001  1.998  1.047 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.065  0.002  0.001  0.001  2.069  1.538 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.113  0.002  0.002  0.002  2.119  2.016 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.221  0.006  0.006  0.004  2.237  3.847 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.254  0.008  0.008  0.005  2.275  4.733 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.301  0.012  0.013  0.006  2.333  6.468 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.348  0.019  0.022  0.009  2.398  9.004 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.398  0.031  0.038  0.013  2.480  1.310 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.432  0.044  0.056  0.017  2.549  1.708 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.508  0.099  0.135  0.033  2.776  3.209 × 10^{4}
100. GeV 1.001 × 10^{5} 2.532  0.129  0.177  0.041  2.879  3.916 × 10^{4}
140. GeV 1.401 × 10^{5} 2.567  0.189  0.266  0.057  3.080  5.259 × 10^{4}
200. GeV 2.001 × 10^{5} 2.604  0.284  0.406  0.080  3.376  7.119 × 10^{4}
300. GeV 3.001 × 10^{5} 2.646  0.447  0.642  0.120  3.857  9.889 × 10^{4}
400. GeV 4.001 × 10^{5} 2.676  0.616  0.888  0.160  4.341  1.233 × 10^{5}
627. GeV 6.275 × 10^{5} 2.723  1.011  1.459  0.253  5.447 Muon critical energy
800. GeV 8.001 × 10^{5} 2.748  1.317  1.900  0.324  6.290  1.994 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.772  1.678  2.420  0.407  7.277  2.290 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.808  2.403  3.457  0.578  9.247  2.776 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.846  3.516  5.045  0.836  12.244  3.339 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.890  5.378  7.685  1.280  17.234  4.024 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.922  7.268  10.358  1.732  22.281  4.533 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.001  14.909  21.113  3.611  42.634  5.809 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.027  18.767  26.525  4.578  52.897  6.229 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.066  26.470  37.314  6.567  73.417  6.868 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.108  38.110  53.576  9.622 104.416  7.550 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.157  57.470  80.645  14.916 156.189  8.328 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.193  76.914 107.793  20.346 208.246  8.881 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.280 154.871 216.464  43.095 417.710  1.021 × 10^{6}
100. TeV 1.000 × 10^{8} 3.308 193.942 270.857  54.873 522.981  1.064 × 10^{6}