Muons in 1,2-dichlorobenzene (C_{6}H_{4}Cl_{2})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.50339 & 1.305 & 106.5 & 0.16010 & 3.0836 & 0.1587 & 2.8276 & 4.0348 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.895  6.895  8.043 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.388  5.388  1.467 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.215  4.215  2.741 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.276  3.276  5.469 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.800  2.801  8.792 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.108  2.108  2.578 × 10^{1}
100. MeV 1.764 × 10^{2} 1.979  1.979  3.559 × 10^{1}
140. MeV 2.218 × 10^{2} 1.848  1.848  5.661 × 10^{1}
200. MeV 2.868 × 10^{2} 1.775  1.776  8.985 × 10^{1}
298. MeV 3.894 × 10^{2} 1.752  0.000  1.752 Minimum ionization
300. MeV 3.917 × 10^{2} 1.752  0.000  1.752  1.467 × 10^{2}
400. MeV 4.945 × 10^{2} 1.762  0.000  1.763  2.037 × 10^{2}
800. MeV 8.995 × 10^{2} 1.840  0.000  0.000  1.841  4.257 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.874  0.000  0.000  1.875  5.333 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.929  0.001  0.000  0.001  1.931  7.434 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.989  0.001  0.000  0.001  1.992  1.049 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.057  0.001  0.001  0.001  2.061  1.542 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.104  0.002  0.002  0.002  2.110  2.021 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.211  0.005  0.005  0.004  2.225  3.861 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.243  0.007  0.007  0.005  2.262  4.752 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.290  0.010  0.011  0.006  2.318  6.498 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.336  0.016  0.018  0.009  2.379  9.051 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.386  0.026  0.032  0.013  2.457  1.318 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.419  0.037  0.047  0.017  2.520  1.720 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.495  0.083  0.113  0.033  2.725  3.244 × 10^{4}
100. GeV 1.001 × 10^{5} 2.519  0.108  0.149  0.041  2.817  3.966 × 10^{4}
140. GeV 1.401 × 10^{5} 2.554  0.159  0.223  0.057  2.994  5.343 × 10^{4}
200. GeV 2.001 × 10^{5} 2.591  0.239  0.341  0.081  3.252  7.265 × 10^{4}
300. GeV 3.001 × 10^{5} 2.633  0.376  0.539  0.122  3.670  1.016 × 10^{5}
400. GeV 4.001 × 10^{5} 2.662  0.518  0.746  0.163  4.089  1.274 × 10^{5}
723. GeV 7.235 × 10^{5} 2.724  0.994  1.433  0.296  5.448 Muon critical energy
800. GeV 8.001 × 10^{5} 2.734  1.109  1.599  0.329  5.772  2.093 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.758  1.413  2.039  0.413  6.623  2.416 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.793  2.026  2.915  0.586  8.320  2.954 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.832  2.965  4.256  0.848  10.901  3.583 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.876  4.537  6.486  1.298  15.198  4.356 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.908  6.134  8.745  1.757  19.544  4.935 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.986  12.593  17.837  3.664  37.079  6.396 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.011  15.855  22.413  4.645  45.925  6.880 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.051  22.366  31.534  6.667  63.617  7.617 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.093  32.208  45.284  9.770  90.356  8.405 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.142  48.581  68.171  15.153 135.047  9.304 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.177  65.029  91.126  20.674 180.007  9.943 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.264 130.963 183.016  43.821 361.065  1.148 × 10^{6}
100. TeV 1.000 × 10^{8} 3.292 164.008 229.011  55.810 452.122  1.198 × 10^{6}