b(E) × 10^{6} [cm^{2}g^{−1}] for

xenon gas (Xe), Z = 54, A =131.293(6)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.3965 0.5319 0.3793 2.3077
5. 1.9264 1.5877 0.4051 3.9192
10. 2.3579 2.4061 0.3970 5.1609
20. 2.8006 3.1942 0.3774 6.3722
50. 3.3817 4.3737 0.3663 8.1217
100. 3.7965 5.1604 0.3586 9.3155
200. 4.1773 5.8639 0.3549 10.3962
500. 4.6081 6.5148 0.3551 11.4780
1000. 4.8700 6.8625 0.3606 12.0930
2000. 5.0753 7.1147 0.3694 12.5595
5000. 5.2677 7.3264 0.3855 12.9796
10000. 5.3639 7.4247 0.4016 13.1901
20000. 5.4280 7.4888 0.4202 13.3371
50000. 5.4813 7.5370 0.4493 13.4675
100000. 5.5052 7.5569 0.4742 13.5363