b(E) × 10^{6} [cm^{2}g^{−1}] for

titanium (Ti), Z = 22, A =47.867(1)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 0.7051 0.3344 0.4173 1.4568
5. 0.9618 0.8273 0.4449 2.2340
10. 1.1703 1.2161 0.4346 2.8210
20. 1.3852 1.6203 0.4173 3.4229
50. 1.6694 2.1993 0.3981 4.2668
100. 1.8750 2.5968 0.3888 4.8606
200. 2.0664 2.9615 0.3842 5.4121
500. 2.2872 3.3083 0.3840 5.9795
1000. 2.4245 3.4980 0.3902 6.3127
2000. 2.5346 3.6377 0.4001 6.5724
5000. 2.6403 3.7561 0.4184 6.8148
10000. 2.6943 3.8117 0.4367 6.9428
20000. 2.7325 3.8479 0.4581 7.0384
50000. 2.7620 3.8756 0.4914 7.1290
100000. 2.7763 3.8871 0.5199 7.1833