b(E) × 10^{6} [cm^{2}g^{−1}] for

technetium (Tc), Z = 43, A =[97.90722(3)]

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.2093 0.5181 0.3896 2.1169
5. 1.6623 1.4129 0.4163 3.4915
10. 2.0305 2.1077 0.3978 4.5360
20. 2.4084 2.7895 0.3869 5.5848
50. 2.9052 3.8016 0.3756 7.0824
100. 3.2609 4.4806 0.3674 8.1089
200. 3.5885 5.0912 0.3635 9.0431
500. 3.9609 5.6597 0.3635 9.9841
1000. 4.1885 5.9650 0.3692 10.5228
2000. 4.3681 6.1874 0.3783 10.9338
5000. 4.5373 6.3745 0.3950 11.3068
10000. 4.6224 6.4616 0.4117 11.4957
20000. 4.6794 6.5184 0.4311 11.6289
50000. 4.7269 6.5614 0.4613 11.7496
100000. 4.7484 6.5792 0.4871 11.8147