b(E) × 10^{6} [cm^{2}g^{−1}] for

strontium (Sr), Z = 38, A =87.62(1)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.0807 0.4823 0.3942 1.9572
5. 1.4836 1.2747 0.4211 3.1794
10. 1.8109 1.8911 0.4022 4.1042
20. 2.1470 2.5019 0.3910 5.0398
50. 2.5894 3.4048 0.3794 6.3737
100. 2.9066 4.0126 0.3711 7.2903
200. 3.1994 4.5608 0.3671 8.1272
500. 3.5332 5.0731 0.3670 8.9733
1000. 3.7378 5.3491 0.3729 9.4598
2000. 3.8997 5.5505 0.3821 9.8323
5000. 4.0529 5.7202 0.3991 10.1721
10000. 4.1301 5.7994 0.4160 10.3454
20000. 4.1819 5.8509 0.4357 10.4686
50000. 4.2252 5.8901 0.4664 10.5818
100000. 4.2449 5.9063 0.4927 10.6439