b(E) × 10^{6} [cm^{2}g^{−1}] for

silver (Ag), Z = 47, A =107.8682(2)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.3140 0.5411 0.3864 2.2416
5. 1.8081 1.5195 0.4130 3.7406
10. 2.2098 2.2784 0.3947 4.8829
20. 2.6219 3.0179 0.3840 6.0238
50. 3.1632 4.1189 0.3729 7.6550
100. 3.5502 4.8559 0.3648 8.7709
200. 3.9062 5.5171 0.3610 9.7843
500. 4.3102 6.1312 0.3610 10.8024
1000. 4.5565 6.4604 0.3667 11.3836
2000. 4.7504 6.6997 0.3757 11.8258
5000. 4.9327 6.9008 0.3922 12.2257
10000. 5.0241 6.9945 0.4086 12.4272
20000. 5.0853 7.0554 0.4278 12.5685
50000. 5.1362 7.1015 0.4577 12.6953
100000. 5.1592 7.1206 0.4832 12.7630