b(E) × 10^{6} [cm^{2}g^{−1}] for

ruthenium (Ru), Z = 44, A =101.07(2)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.2375 0.5252 0.3888 2.1515
5. 1.7016 1.4423 0.4155 3.5593
10. 2.0787 2.1541 0.3971 4.6299
20. 2.4657 2.8515 0.3862 5.7034
50. 2.9745 3.8874 0.3749 7.2368
100. 3.3385 4.5819 0.3668 8.2872
200. 3.6737 5.2061 0.3629 9.2427
500. 4.0546 5.7869 0.3629 10.2044
1000. 4.2873 6.0987 0.3686 10.7546
2000. 4.4707 6.3257 0.3777 11.1740
5000. 4.6435 6.5166 0.3943 11.5544
10000. 4.7302 6.6055 0.4110 11.7467
20000. 4.7884 6.6634 0.4303 11.8821
50000. 4.8368 6.7071 0.4604 12.0044
100000. 4.8587 6.7255 0.4861 12.0704