b(E) × 10^{6} [cm^{2}g^{−1}] for

rhodium (Rh), Z = 45, A =102.90550(2)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.2689 0.5331 0.3882 2.1902
5. 1.7450 1.4746 0.4148 3.6344
10. 2.1320 2.2052 0.3964 4.7336
20. 2.5291 2.9196 0.3856 5.8343
50. 3.0509 3.9817 0.3744 7.4070
100. 3.4242 4.6934 0.3663 8.4838
200. 3.7678 5.3326 0.3624 9.4628
500. 4.1580 5.9271 0.3624 10.4475
1000. 4.3962 6.2460 0.3681 11.0104
2000. 4.5839 6.4781 0.3771 11.4392
5000. 4.7607 6.6732 0.3938 11.8276
10000. 4.8494 6.7641 0.4103 12.0238
20000. 4.9088 6.8233 0.4296 12.1616
50000. 4.9582 6.8680 0.4597 12.2859
100000. 4.9806 6.8867 0.4853 12.3526