b(E) × 10^{6} [cm^{2}g^{−1}] for

rhenium (Re), Z = 75, A =186.207(1)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.8307 0.4713 0.3667 2.6686
5. 2.5366 1.8861 0.3916 4.8143
10. 3.1125 2.9839 0.3839 6.4803
20. 3.7034 4.0103 0.3654 8.0790
50. 4.4768 5.5686 0.3549 10.4003
100. 5.0269 6.5994 0.3477 11.9739
200. 5.5293 7.5143 0.3443 13.3878
500. 6.0935 8.3536 0.3444 14.7916
1000. 6.4336 8.7986 0.3498 15.5820
2000. 6.6984 9.1197 0.3582 16.1763
5000. 6.9441 9.3882 0.3736 16.7059
10000. 7.0659 9.5123 0.3889 16.9670
20000. 7.1466 9.5932 0.4067 17.1465
50000. 7.2133 9.6535 0.4345 17.3013
100000. 7.2429 9.6785 0.4582 17.3797