b(E) × 10^{6} [cm^{2}g^{−1}] for

radon (Rn), Z = 86, A =[222.01758(2)]

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.9814 0.3638 0.3605 2.7057
5. 2.7520 1.9117 0.3847 5.0485
10. 3.3816 3.1147 0.3773 6.8736
20. 4.0278 4.2247 0.3640 8.6165
50. 4.8729 5.9220 0.3490 11.1440
100. 5.4733 7.0409 0.3420 12.8562
200. 6.0204 8.0311 0.3387 14.3903
500. 6.6332 8.9365 0.3389 15.9086
1000. 7.0012 9.4151 0.3442 16.7605
2000. 7.2867 9.7597 0.3524 17.3989
5000. 7.5509 10.0474 0.3675 17.9658
10000. 7.6812 10.1800 0.3825 18.2437
20000. 7.7674 10.2665 0.3999 18.4338
50000. 7.8386 10.3308 0.4270 18.5964
100000. 7.8700 10.3576 0.4503 18.6779