b(E) × 10^{6} [cm^{2}g^{−1}] for

palladium (Pd), Z = 46, A =106.42(1)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.2780 0.5322 0.3869 2.1971
5. 1.7583 1.4830 0.4135 3.6547
10. 2.1488 2.2207 0.3953 4.7647
20. 2.5494 2.9407 0.3845 5.8746
50. 3.0759 4.0120 0.3733 7.4612
100. 3.4524 4.7294 0.3652 8.5470
200. 3.7989 5.3735 0.3614 9.5337
500. 4.1922 5.9720 0.3614 10.5256
1000. 4.4322 6.2930 0.3671 11.0922
2000. 4.6211 6.5264 0.3761 11.5237
5000. 4.7989 6.7227 0.3926 11.9143
10000. 4.8881 6.8141 0.4091 12.1114
20000. 4.9478 6.8736 0.4283 12.2498
50000. 4.9975 6.9186 0.4582 12.3744
100000. 5.0200 6.9373 0.4838 12.4411