b(E) × 10^{6} [cm^{2}g^{−1}] for

osmium (Os), Z = 76, A =190.23(3)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.8362 0.4610 0.3659 2.6631
5. 2.5450 1.8822 0.3907 4.8179
10. 3.1233 2.9851 0.3831 6.4915
20. 3.7168 4.0150 0.3647 8.0965
50. 4.4935 5.5797 0.3542 10.4274
100. 5.0459 6.6142 0.3470 12.0071
200. 5.5504 7.5323 0.3436 13.4263
500. 6.1167 8.3742 0.3438 14.8347
1000. 6.4580 8.8205 0.3491 15.6276
2000. 6.7235 9.1424 0.3575 16.2234
5000. 6.9700 9.4116 0.3728 16.7544
10000. 7.0920 9.5359 0.3881 17.0160
20000. 7.1728 9.6171 0.4059 17.1958
50000. 7.2397 9.6774 0.4336 17.3507
100000. 7.2694 9.7025 0.4573 17.4292