b(E) × 10^{6} [cm^{2}g^{−1}] for

molybdenum (Mo), Z = 42, A =95.95(1)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.1943 0.5158 0.3908 2.1009
5. 1.6411 1.3974 0.4176 3.4560
10. 2.0042 2.0820 0.3989 4.4851
20. 2.3768 2.7552 0.3879 5.5199
50. 2.8668 3.7537 0.3766 6.9971
100. 3.2176 4.4239 0.3684 8.0099
200. 3.5409 5.0270 0.3645 8.9323
500. 3.9086 5.5889 0.3644 9.8620
1000. 4.1335 5.8909 0.3702 10.3946
2000. 4.3110 6.1108 0.3793 10.8012
5000. 4.4784 6.2960 0.3961 11.1705
10000. 4.5626 6.3823 0.4128 11.3577
20000. 4.6191 6.4385 0.4323 11.4898
50000. 4.6661 6.4810 0.4626 11.6097
100000. 4.6874 6.4987 0.4885 11.6747