b(E) × 10^{6} [cm^{2}g^{−1}] for

mercury (Hg), Z = 80, A =200.592(2)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.9183 0.4303 0.3640 2.7126
5. 2.6605 1.9192 0.3887 4.9685
10. 3.2665 3.0753 0.3811 6.7229
20. 3.8882 4.1495 0.3629 8.4006
50. 4.7016 5.7859 0.3525 10.8399
100. 5.2798 6.8665 0.3453 12.4915
200. 5.8073 7.8243 0.3419 13.9735
500. 6.3990 8.7015 0.3421 15.4426
1000. 6.7550 9.1660 0.3474 16.2684
2000. 7.0317 9.5008 0.3558 16.8883
5000. 7.2881 9.7806 0.3710 17.4397
10000. 7.4149 9.9097 0.3862 17.7108
20000. 7.4988 9.9940 0.4038 17.8966
50000. 7.5682 10.0566 0.4313 18.0562
100000. 7.5990 10.0827 0.4549 18.1366