b(E) × 10^{6} [cm^{2}g^{−1}] for

lutetium (Lu), Z = 71, A =174.9668(1)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.7575 0.4975 0.3689 2.6238
5. 2.4332 1.8507 0.3940 4.6778
10. 2.9842 2.9001 0.3863 6.2706
20. 3.5495 3.8864 0.3675 7.8035
50. 4.2897 5.3799 0.3570 10.0266
100. 4.8165 6.3691 0.3496 11.5353
200. 5.2981 7.2483 0.3462 12.8925
500. 5.8396 8.0558 0.3463 14.2417
1000. 6.1664 8.4845 0.3517 15.0026
2000. 6.4211 8.7941 0.3602 15.5754
5000. 6.6579 9.0531 0.3757 16.0868
10000. 6.7754 9.1729 0.3912 16.3395
20000. 6.8534 9.2510 0.4091 16.5135
50000. 6.9179 9.3095 0.4371 16.6645
100000. 6.9466 9.3338 0.4611 16.7414