b(E) × 10^{6} [cm^{2}g^{−1}] for

indium (In), Z = 49, A =114.818(3)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.3332 0.5382 0.3841 2.2556
5. 1.8360 1.5358 0.4104 3.7823
10. 2.2449 2.3095 0.3926 4.9470
20. 2.6645 3.0607 0.3819 6.1071
50. 3.2155 4.1808 0.3708 7.7672
100. 3.6093 4.9298 0.3629 8.9019
200. 3.9713 5.6011 0.3591 9.9315
500. 4.3817 6.2239 0.3591 10.9647
1000. 4.6317 6.5573 0.3648 11.5538
2000. 4.8283 6.7996 0.3737 12.0016
5000. 5.0130 7.0031 0.3901 12.4061
10000. 5.1054 7.0978 0.4064 12.6096
20000. 5.1672 7.1595 0.4254 12.7521
50000. 5.2187 7.2060 0.4550 12.8797
100000. 5.2419 7.2254 0.4803 12.9475