b(E) × 10^{6} [cm^{2}g^{−1}] for

holmium (Ho), Z = 67, A =164.93033(2)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.6707 0.5146 0.3710 2.5563
5. 2.3114 1.7966 0.3962 4.5042
10. 2.8336 2.7905 0.3885 6.0126
20. 3.3694 3.7296 0.3696 7.4686
50. 4.0713 5.1478 0.3589 9.5781
100. 4.5712 6.0885 0.3515 11.0112
200. 5.0285 6.9257 0.3480 12.3022
500. 5.5435 7.6957 0.3481 13.5874
1000. 5.8547 8.1051 0.3536 14.3134
2000. 6.0976 8.4010 0.3621 14.8607
5000. 6.3238 8.6487 0.3777 15.3503
10000. 6.4362 8.7634 0.3933 15.5929
20000. 6.5109 8.8382 0.4114 15.7605
50000. 6.5727 8.8940 0.4396 15.9063
100000. 6.6003 8.9174 0.4637 15.9815