b(E) × 10^{6} [cm^{2}g^{−1}] for

gadolinium oxysulfide (Gd_{2}O_{2}S) ⟨Z/A⟩ = 0.42266

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.4107 0.4701 0.3851 2.2659
5. 1.9485 1.5419 0.4109 3.9014
10. 2.3869 2.3747 0.4022 5.1639
20. 2.8369 3.1698 0.3831 6.3897
50. 3.4272 4.3641 0.3705 8.1618
100. 3.8484 5.1592 0.3624 9.3701
200. 4.2347 5.8676 0.3586 10.4609
500. 4.6708 6.5251 0.3586 11.5546
1000. 4.9354 6.8759 0.3643 12.1755
2000. 5.1426 7.1296 0.3733 12.6454
5000. 5.3363 7.3425 0.3897 13.0685
10000. 5.4330 7.4412 0.4060 13.2803
20000. 5.4975 7.5055 0.4252 13.4282
50000. 5.5509 7.5539 0.4550 13.5598
100000. 5.5749 7.5739 0.4804 13.6293