b(E) × 10^{6} [cm^{2}g^{−1}] for

gadolinium (Gd), Z = 64, A =157.25(3)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.6070 0.5239 0.3727 2.5036
5. 2.2219 1.7534 0.3981 4.3734
10. 2.7230 2.7065 0.3902 5.8197
20. 3.2371 3.6107 0.3712 7.2190
50. 3.9108 4.9735 0.3605 9.2448
100. 4.3909 5.8784 0.3530 10.6223
200. 4.8304 6.6847 0.3495 11.8646
500. 5.3258 7.4271 0.3496 13.1026
1000. 5.6256 7.8222 0.3551 13.8029
2000. 5.8598 8.1080 0.3637 14.3315
5000. 6.0782 8.3474 0.3794 14.8050
10000. 6.1868 8.4583 0.3950 15.0402
20000. 6.2591 8.5306 0.4133 15.2030
50000. 6.3189 8.5848 0.4417 15.3454
100000. 6.3457 8.6073 0.4659 15.4189