b(E) × 10^{6} [cm^{2}g^{−1}] for

ferrous sulfate dosimeter solution ⟨Z/A⟩ = 0.55329

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 0.2944 0.1299 0.4690 0.8933
5. 0.3995 0.3206 0.4966 1.2167
10. 0.4863 0.4836 0.4818 1.4517
20. 0.5777 0.6607 0.4596 1.6979
50. 0.7018 0.9101 0.4353 2.0472
100. 0.7939 1.0862 0.4234 2.3035
200. 0.8820 1.2480 0.4173 2.5474
500. 0.9857 1.4141 0.4164 2.8163
1000. 1.0521 1.5154 0.4231 2.9906
2000. 1.1073 1.5866 0.4343 3.1282
5000. 1.1623 1.6493 0.4554 3.2670
10000. 1.1916 1.6788 0.4768 3.3474
20000. 1.2123 1.6975 0.5020 3.4118
50000. 1.2301 1.7123 0.5414 3.4838
100000. 1.2387 1.7183 0.5752 3.5323