b(E) × 10^{6} [cm^{2}g^{−1}] for

dysprosium (Dy), Z = 66, A =162.500(1)

E [GeV] b_{brems} b_{pair}  b_{nucl}  b_{tot}
2. 1.6481 0.5176 0.3715 2.5373
5. 2.2796 1.7812 0.3968 4.4576
10. 2.7944 2.7607 0.3890 5.9441
20. 3.3225 3.6875 0.3701 7.3800
50. 4.0145 5.0861 0.3594 9.4600
100. 4.5074 6.0142 0.3520 10.8735
200. 4.9584 6.8404 0.3484 12.1472
500. 5.4664 7.6007 0.3486 13.4157
1000. 5.7736 8.0049 0.3540 14.1326
2000. 6.0134 8.2972 0.3626 14.6733
5000. 6.2369 8.5420 0.3783 15.1571
10000. 6.3479 8.6553 0.3939 15.3971
20000. 6.4217 8.7293 0.4120 15.5630
50000. 6.4828 8.7845 0.4403 15.7075
100000. 6.5101 8.8075 0.4644 15.7820